Muons in niobium (Nb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
41 (Nb) 92.90637(2) 8.570  417.0 0.13883 3.0930 0.1785 3.2201 5.0141  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.890  4.890  1.161 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.861  3.861  2.091 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.049  3.049  3.858 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.390  2.390  7.612 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.054  2.054  1.215 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.561  1.561  3.517 × 10^{1}
100. MeV 1.764 × 10^{2} 1.474  1.474  4.839 × 10^{1}
140. MeV 2.218 × 10^{2} 1.390  1.390  7.645 × 10^{1}
200. MeV 2.868 × 10^{2} 1.349  1.349  1.204 × 10^{2}
253. MeV 3.431 × 10^{2} 1.343  1.343 Minimum ionization
300. MeV 3.917 × 10^{2} 1.346  0.000  0.000  1.347  1.948 × 10^{2}
400. MeV 4.945 × 10^{2} 1.364  0.000  0.000  1.365  2.686 × 10^{2}
800. MeV 8.995 × 10^{2} 1.449  0.001  0.000  1.450  5.526 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.482  0.001  0.000  1.484  6.890 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.536  0.001  0.000  0.001  1.539  9.534 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.594  0.002  0.001  0.001  1.599  1.336 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.660  0.004  0.003  0.001  1.668  1.947 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.704  0.006  0.005  0.002  1.717  2.537 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.806  0.015  0.015  0.003  1.839  4.779 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.836  0.020  0.021  0.004  1.881  5.854 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.880  0.030  0.033  0.006  1.950  7.941 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.923  0.047  0.055  0.008  2.033  1.095 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.969  0.077  0.095  0.012  2.153  1.573 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.000  0.108  0.139  0.015  2.263  2.026 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.068  0.245  0.332  0.030  2.676  3.648 × 10^{4}
100. GeV 1.001 × 10^{5} 2.089  0.317  0.437  0.037  2.881  4.368 × 10^{4}
140. GeV 1.401 × 10^{5} 2.120  0.466  0.652  0.051  3.291  5.667 × 10^{4}
200. GeV 2.001 × 10^{5} 2.153  0.699  0.992  0.073  3.918  7.336 × 10^{4}
241. GeV 2.410 × 10^{5} 2.170  0.859  1.222  0.088  4.340 Muon critical energy
300. GeV 3.001 × 10^{5} 2.189  1.096  1.562  0.110  4.958  9.601 × 10^{4}
400. GeV 4.001 × 10^{5} 2.215  1.507  2.153  0.146  6.022  1.143 × 10^{5}
800. GeV 8.001 × 10^{5} 2.278  3.205  4.576  0.295  10.356  1.644 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.299  4.078  5.816  0.371  12.565  1.819 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.330  5.828  8.290  0.526  16.975  2.092 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.364  8.507  12.066  0.761  23.698  2.390 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.403  12.980  18.342  1.163  34.889  2.735 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.430  17.514  24.686  1.572  46.204  2.984 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.499  35.802  50.193  3.268  91.764  3.586 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.521  45.021  63.016  4.140 114.700  3.781 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.556  63.409  88.600  5.929 160.495  4.074 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.593  91.160 127.144  8.670 229.568  4.385 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.635 137.359 191.276  13.410 344.681  4.738 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.666 183.730 255.565  18.263 460.225  4.988 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.742 369.518 512.907  38.530 923.699  5.590 × 10^{5}
100. TeV 1.000 × 10^{8} 2.767 462.580 641.700  49.000 1156.049  5.783 × 10^{5}