Muons in nickel (Ni)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
28 (Ni) 58.6934(4)  8.902  311.0 0.16496 2.8430 −0.0566 3.1851 4.3115  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.551  5.551  1.016 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.369  4.369  1.836 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.439  3.439  3.401 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.687  2.687  6.736 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.302  2.303  1.078 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.737  1.737  3.141 × 10^{1}
100. MeV 1.764 × 10^{2} 1.634  1.634  4.331 × 10^{1}
140. MeV 2.218 × 10^{2} 1.533  1.533  6.869 × 10^{1}
200. MeV 2.868 × 10^{2} 1.480  1.480  1.087 × 10^{2}
267. MeV 3.577 × 10^{2} 1.468  0.000  1.468 Minimum ionization
300. MeV 3.917 × 10^{2} 1.469  0.000  1.470  1.767 × 10^{2}
400. MeV 4.945 × 10^{2} 1.484  0.000  0.000  1.485  2.444 × 10^{2}
800. MeV 8.995 × 10^{2} 1.567  0.000  0.000  1.568  5.063 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.602  0.001  0.000  1.603  6.324 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.658  0.001  0.000  0.001  1.660  8.774 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.718  0.002  0.001  0.001  1.722  1.232 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.787  0.003  0.002  0.001  1.794  1.800 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.835  0.005  0.004  0.002  1.845  2.349 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.943  0.011  0.011  0.003  1.970  4.440 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.976  0.015  0.016  0.004  2.012  5.444 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.023  0.023  0.026  0.006  2.078  7.399 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.070  0.036  0.042  0.008  2.156  1.023 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.120  0.059  0.073  0.012  2.264  1.475 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.153  0.083  0.107  0.016  2.359  1.908 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.227  0.188  0.255  0.031  2.702  3.489 × 10^{4}
100. GeV 1.001 × 10^{5} 2.250  0.243  0.336  0.038  2.868  4.208 × 10^{4}
140. GeV 1.401 × 10^{5} 2.284  0.357  0.501  0.053  3.196  5.529 × 10^{4}
200. GeV 2.001 × 10^{5} 2.319  0.535  0.764  0.076  3.694  7.274 × 10^{4}
300. GeV 3.001 × 10^{5} 2.358  0.840  1.204  0.114  4.517  9.718 × 10^{4}
326. GeV 3.262 × 10^{5} 2.366  0.921  1.322  0.123  4.734 Muon critical energy
400. GeV 4.001 × 10^{5} 2.386  1.155  1.661  0.151  5.354  1.175 × 10^{5}
800. GeV 8.001 × 10^{5} 2.455  2.459  3.536  0.306  8.757  1.754 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.477  3.130  4.496  0.385  10.489  1.962 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.511  4.476  6.414  0.545  13.946  2.292 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.547  6.537  9.342  0.788  19.215  2.657 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.589  9.982  14.209  1.206  27.986  3.086 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.619  13.475  19.130  1.631  36.856  3.396 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.693  27.573  38.923  3.393  72.583  4.155 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.717  34.683  48.876  4.299  90.576  4.401 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.754  48.865  68.732  6.160 126.512  4.773 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.794  70.276  98.650  9.014 180.735  5.168 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.841 105.920 148.430  13.951 271.143  5.617 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.874 141.705 198.338  19.008 361.926  5.935 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.956 285.101 398.120  40.151 726.329  6.700 × 10^{5}
100. TeV 1.000 × 10^{8} 2.983 356.940 498.110  51.080 909.114  6.945 × 10^{5}