Muons in neptunium (Np)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
93 (Np) [237.04817(2)] 20.250  902.0 0.19741 2.8082 0.1869 3.3690 5.8149  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.707  3.707  1.578 × 10^{0}
14.0 MeV 5.616 × 10^{1} 2.967  2.968  2.795 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.370  2.370  5.080 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.878  1.878  9.879 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.623  1.623  1.564 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.249  1.249  4.456 × 10^{1}
100. MeV 1.764 × 10^{2} 1.183  1.183  6.106 × 10^{1}
140. MeV 2.218 × 10^{2} 1.123  1.123  9.590 × 10^{1}
200. MeV 2.868 × 10^{2} 1.096  1.097  1.502 × 10^{2}
227. MeV 3.154 × 10^{2} 1.095  0.000  1.095 Minimum ionization
300. MeV 3.917 × 10^{2} 1.102  0.000  0.000  1.102  2.413 × 10^{2}
400. MeV 4.945 × 10^{2} 1.122  0.000  0.000  1.123  3.312 × 10^{2}
800. MeV 8.995 × 10^{2} 1.205  0.001  0.000  1.207  6.743 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.237  0.002  0.000  1.240  8.377 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.289  0.003  0.001  1.292  1.153 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.344  0.004  0.001  0.001  1.350  1.607 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.406  0.008  0.003  0.001  1.418  2.329 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.449  0.011  0.006  0.002  1.468  3.021 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.545  0.028  0.023  0.003  1.600  5.621 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.574  0.037  0.033  0.004  1.649  6.852 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.616  0.056  0.054  0.005  1.733  9.217 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.657  0.088  0.090  0.007  1.843  1.257 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.700  0.144  0.159  0.011  2.015  1.776 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.729  0.203  0.236  0.014  2.183  2.252 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.793  0.460  0.573  0.027  2.855  3.850 × 10^{4}
100. GeV 1.001 × 10^{5} 1.812  0.596  0.755  0.034  3.199  4.512 × 10^{4}
127. GeV 1.271 × 10^{5} 1.832  0.783  1.006  0.043  3.666 Muon critical energy
140. GeV 1.401 × 10^{5} 1.840  0.875  1.130  0.047  3.894  5.644 × 10^{4}
200. GeV 2.001 × 10^{5} 1.869  1.312  1.725  0.067  4.974  7.005 × 10^{4}
300. GeV 3.001 × 10^{5} 1.902  2.056  2.717  0.101  6.777  8.721 × 10^{4}
400. GeV 4.001 × 10^{5} 1.925  2.824  3.746  0.135  8.631  1.003 × 10^{5}
800. GeV 8.001 × 10^{5} 1.981  5.995  7.962  0.272  16.212  1.336 × 10^{5}
1.00 TeV 1.000 × 10^{6} 1.999  7.622  10.119  0.342  20.084  1.446 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.027  10.880  14.419  0.485  27.813  1.615 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.057  15.861  20.982  0.701  39.602  1.795 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.091  24.170  31.884  1.071  59.218  2.000 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.116  32.585  42.901  1.446  79.051  2.146 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.177  66.487  87.181  3.002 158.849  2.495 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.197  83.561 109.435  3.801 198.996  2.608 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.227 117.615 153.842  5.438 279.125  2.777 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.260 168.976 220.732  7.946 399.916  2.955 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.298 254.563 332.013  12.277 601.154  3.158 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.326 340.457 443.549  16.709 803.043  3.301 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.393 684.014 890.002  35.192 1611.604  3.646 × 10^{5}
100. TeV 1.000 × 10^{8} 2.416 855.900 1113.430  44.730 2016.478  3.757 × 10^{5}