Muons in neon gas (Ne)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
10 (Ne) 20.1797(6) 8.385 × 10^{−4} 137.0 0.08064 3.5771 2.0735 4.6421 11.9041 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.548  6.548  8.508 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.126  5.126  1.548 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.016  4.017  2.886 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.126  3.126  5.747 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.675  2.675  9.227 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.019  2.019  2.698 × 10^{1}
100. MeV 1.764 × 10^{2} 1.902  1.902  3.721 × 10^{1}
140. MeV 2.218 × 10^{2} 1.788  1.788  5.901 × 10^{1}
200. MeV 2.868 × 10^{2} 1.732  1.732  9.322 × 10^{1}
247. MeV 3.366 × 10^{2} 1.724  0.000  1.724 Minimum ionization
300. MeV 3.917 × 10^{2} 1.729  0.000  1.730  1.511 × 10^{2}
400. MeV 4.945 × 10^{2} 1.756  0.000  1.756  2.086 × 10^{2}
800. MeV 8.995 × 10^{2} 1.881  0.000  0.000  1.882  4.284 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.933  0.000  0.000  1.934  5.332 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.018  0.000  0.000  0.001  2.019  7.354 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.114  0.001  0.000  0.001  2.116  1.025 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.226  0.001  0.001  0.001  2.230  1.485 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.307  0.002  0.001  0.002  2.312  1.925 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.502  0.005  0.005  0.004  2.515  3.575 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.565  0.006  0.006  0.005  2.582  4.360 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.652  0.010  0.010  0.006  2.678  5.878 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.729  0.015  0.017  0.009  2.770  8.079 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.809  0.024  0.030  0.013  2.876  1.162 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.860  0.034  0.043  0.017  2.955  1.505 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.970  0.077  0.105  0.033  3.186  2.805 × 10^{4}
100. GeV 1.001 × 10^{5} 3.002  0.100  0.138  0.041  3.282  3.424 × 10^{4}
140. GeV 1.401 × 10^{5} 3.047  0.148  0.206  0.057  3.459  4.610 × 10^{4}
200. GeV 2.001 × 10^{5} 3.092  0.222  0.315  0.081  3.712  6.284 × 10^{4}
300. GeV 3.001 × 10^{5} 3.141  0.350  0.500  0.122  4.113  8.842 × 10^{4}
400. GeV 4.001 × 10^{5} 3.174  0.482  0.692  0.162  4.510  1.116 × 10^{5}
800. GeV 8.001 × 10^{5} 3.250  1.032  1.488  0.328  6.099  1.876 × 10^{5}
907. GeV 9.071 × 10^{5} 3.263  1.183  1.707  0.373  6.527 Muon critical energy
1.00 TeV 1.000 × 10^{6} 3.274  1.316  1.899  0.413  6.902  2.184 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.310  1.886  2.715  0.585  8.497  2.706 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.348  2.762  3.965  0.847  10.921  3.327 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.391  4.227  6.044  1.297  14.960  4.107 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.423  5.716  8.151  1.754  19.045  4.698 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.500  11.738  16.631  3.659  35.528  6.211 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.525  14.780  20.900  4.639  43.844  6.717 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.563  20.849  29.408  6.656  60.477  7.491 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.605  30.022  42.236  9.754  85.617  8.321 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.653  45.295  63.586  15.126 127.660  9.271 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.688  60.640  85.002  20.637 169.966  9.948 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.773 122.163 170.729  43.730 340.396  1.158 × 10^{6}
100. TeV 1.000 × 10^{8} 3.801 153.000 213.640  55.690 426.132  1.210 × 10^{6}