Muons in neodymium (Nd)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
60 (Nd) 144.242(3)  7.008  546.0 0.23530 2.7050 0.1950 3.3029 5.8135  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.388  4.388  1.303 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.477  3.477  2.337 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.753  2.753  4.297 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.164  2.164  8.447 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.863  1.863  1.346 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.421  1.421  3.878 × 10^{1}
100. MeV 1.764 × 10^{2} 1.343  1.343  5.330 × 10^{1}
140. MeV 2.218 × 10^{2} 1.269  1.269  8.407 × 10^{1}
200. MeV 2.868 × 10^{2} 1.235  1.235  1.322 × 10^{2}
239. MeV 3.285 × 10^{2} 1.231  0.000  1.231 Minimum ionization
300. MeV 3.917 × 10^{2} 1.236  0.000  0.000  1.236  2.133 × 10^{2}
400. MeV 4.945 × 10^{2} 1.256  0.000  0.000  1.256  2.936 × 10^{2}
800. MeV 8.995 × 10^{2} 1.341  0.001  0.000  1.342  6.012 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.375  0.001  0.000  1.377  7.482 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.429  0.002  0.000  0.001  1.432  1.033 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.488  0.003  0.001  0.001  1.493  1.443 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.554  0.006  0.003  0.001  1.564  2.096 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.599  0.008  0.006  0.002  1.615  2.725 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.702  0.020  0.019  0.003  1.744  5.098 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.733  0.026  0.027  0.004  1.790  6.230 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.777  0.040  0.043  0.005  1.866  8.417 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.821  0.063  0.070  0.007  1.962  1.155 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.867  0.102  0.123  0.011  2.104  1.647 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.898  0.145  0.180  0.015  2.238  2.107 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.965  0.327  0.434  0.029  2.755  3.715 × 10^{4}
100. GeV 1.001 × 10^{5} 1.985  0.423  0.570  0.036  3.015  4.408 × 10^{4}
140. GeV 1.401 × 10^{5} 2.015  0.622  0.851  0.050  3.538  5.632 × 10^{4}
180. GeV 1.802 × 10^{5} 2.037  0.828  1.146  0.064  4.075 Muon critical energy
200. GeV 2.001 × 10^{5} 2.046  0.932  1.296  0.070  4.345  7.161 × 10^{4}
300. GeV 3.001 × 10^{5} 2.080  1.461  2.039  0.106  5.687  9.168 × 10^{4}
400. GeV 4.001 × 10^{5} 2.105  2.008  2.809  0.141  7.064  1.074 × 10^{5}
800. GeV 8.001 × 10^{5} 2.164  4.266  5.966  0.285  12.682  1.491 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.184  5.425  7.580  0.358  15.548  1.633 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.213  7.750  10.801  0.507  21.272  1.853 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.245  11.304  15.716  0.733  29.999  2.089 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.281  17.238  23.882  1.120  44.523  2.361 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.307  23.250  32.135  1.514  59.207  2.555 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.372  47.485  65.308  3.145 118.311  3.024 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.393  59.696  81.982  3.982 148.055  3.175 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.426  84.051 115.253  5.700 207.431  3.402 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.460 120.796 165.370  8.332 296.960  3.642 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.501 181.968 248.756  12.879 446.105  3.915 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.530 243.356 332.338  17.532 595.758  4.109 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.602 489.264 666.903  36.958 1195.728  4.573 × 10^{5}
100. TeV 1.000 × 10^{8} 2.625 612.420 834.340  46.990 1496.377  4.722 × 10^{5}