Muons in n-hexane C_{6}H_{14}

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.59020 & 0.660 & 54.0 & 0.11085 & 3.5027 & 0.1984 & 2.5757 & 3.2156 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.828  8.828  6.242 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.876  6.876  1.143 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.362  5.362  2.143 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.154  4.154  4.291 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.543  3.543  6.915 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.654  2.654  2.038 × 10^{1}
100. MeV 1.764 × 10^{2} 2.491  2.491  2.817 × 10^{1}
140. MeV 2.218 × 10^{2} 2.317  2.317  4.491 × 10^{1}
200. MeV 2.868 × 10^{2} 2.216  2.216  7.149 × 10^{1}
300. MeV 3.917 × 10^{2} 2.175  0.000  2.175  1.172 × 10^{2}
328. MeV 4.211 × 10^{2} 2.174  0.000  2.174 Minimum ionization
400. MeV 4.945 × 10^{2} 2.179  0.000  2.179  1.631 × 10^{2}
800. MeV 8.995 × 10^{2} 2.255  0.000  0.000  2.255  3.436 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.290  0.000  0.000  2.291  4.316 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.348  0.000  0.001  2.349  6.039 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.412  0.000  0.000  0.001  2.413  8.558 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.484  0.001  0.000  0.001  2.487  1.264 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.535  0.001  0.001  0.002  2.539  1.661 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.651  0.003  0.003  0.004  2.660  3.196 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.686  0.004  0.004  0.005  2.699  3.942 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.738  0.006  0.006  0.007  2.756  5.408 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.790  0.009  0.010  0.009  2.818  7.559 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.846  0.014  0.018  0.014  2.892  1.106 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.885  0.020  0.026  0.018  2.950  1.448 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.974  0.047  0.063  0.035  3.119  2.765 × 10^{4}
100. GeV 1.001 × 10^{5} 3.002  0.061  0.083  0.043  3.189  3.399 × 10^{4}
140. GeV 1.401 × 10^{5} 3.043  0.090  0.125  0.060  3.318  4.628 × 10^{4}
200. GeV 2.001 × 10^{5} 3.087  0.135  0.191  0.085  3.499  6.388 × 10^{4}
300. GeV 3.001 × 10^{5} 3.136  0.214  0.305  0.128  3.782  9.136 × 10^{4}
400. GeV 4.001 × 10^{5} 3.170  0.296  0.423  0.170  4.060  1.169 × 10^{5}
800. GeV 8.001 × 10^{5} 3.255  0.639  0.917  0.343  5.154  2.041 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.282  0.816  1.173  0.431  5.703  2.410 × 10^{5}
1.34 TeV 1.344 × 10^{6} 3.319  1.122  1.610  0.586  6.638 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.324  1.173  1.683  0.612  6.792  3.052 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.369  1.723  2.465  0.886  8.443  3.843 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.421  2.646  3.768  1.358  11.193  4.868 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.458  3.586  5.091  1.838  13.973  5.666 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.549  7.398  10.421  3.839  25.208  7.768 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.580  9.329  13.106  4.871  30.885  8.484 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.625  13.183  18.456  6.997  42.261  9.586 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.675  19.017  26.527  10.266  59.486  1.078 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.732  28.736  39.953  15.944  88.366  1.215 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.773  38.512  53.425  21.774 117.486  1.313 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.875  77.713 107.361  46.269 235.219  1.549 × 10^{6}
100. TeV 1.000 × 10^{8} 3.909  97.367 134.363  58.976 294.615  1.625 × 10^{6}