Muons in n-heptane (C_{7}H_{16})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.57992 & 0.684 & 54.4 & 0.11255 & 3.4885 & 0.1928 & 2.5706 & 3.1978 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.667  8.667  6.359 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.750  6.750  1.164 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.264  5.264  2.183 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.078  4.078  4.371 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.479  3.479  7.044 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.606  2.606  2.076 × 10^{1}
100. MeV 1.764 × 10^{2} 2.444  2.444  2.870 × 10^{1}
140. MeV 2.218 × 10^{2} 2.274  2.274  4.574 × 10^{1}
200. MeV 2.868 × 10^{2} 2.175  2.175  7.283 × 10^{1}
300. MeV 3.917 × 10^{2} 2.134  0.000  2.135  1.194 × 10^{2}
328. MeV 4.211 × 10^{2} 2.133  0.000  2.134 Minimum ionization
400. MeV 4.945 × 10^{2} 2.139  0.000  2.139  1.662 × 10^{2}
800. MeV 8.995 × 10^{2} 2.213  0.000  0.000  2.213  3.502 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.247  0.000  0.000  2.248  4.398 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.304  0.000  0.001  2.305  6.154 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.367  0.000  0.000  0.001  2.368  8.720 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.438  0.001  0.000  0.001  2.441  1.287 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.488  0.001  0.001  0.002  2.492  1.693 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.602  0.003  0.003  0.004  2.611  3.256 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.637  0.004  0.004  0.005  2.649  4.016 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.687  0.006  0.006  0.007  2.706  5.510 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.738  0.009  0.010  0.009  2.767  7.701 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.794  0.014  0.018  0.014  2.840  1.127 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.832  0.020  0.026  0.018  2.896  1.475 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.919  0.047  0.063  0.035  3.064  2.816 × 10^{4}
100. GeV 1.001 × 10^{5} 2.947  0.061  0.083  0.043  3.134  3.461 × 10^{4}
140. GeV 1.401 × 10^{5} 2.987  0.090  0.125  0.060  3.262  4.711 × 10^{4}
200. GeV 2.001 × 10^{5} 3.030  0.136  0.191  0.085  3.442  6.501 × 10^{4}
300. GeV 3.001 × 10^{5} 3.078  0.215  0.305  0.128  3.725  9.292 × 10^{4}
400. GeV 4.001 × 10^{5} 3.112  0.297  0.424  0.170  4.003  1.188 × 10^{5}
800. GeV 8.001 × 10^{5} 3.195  0.639  0.918  0.343  5.096  2.071 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.222  0.817  1.175  0.431  5.645  2.444 × 10^{5}
1.32 TeV 1.319 × 10^{6} 3.256  1.101  1.580  0.575  6.512 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.263  1.174  1.685  0.612  6.734  3.092 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.307  1.725  2.468  0.886  8.386  3.889 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.358  2.648  3.773  1.358  11.137  4.921 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.395  3.589  5.097  1.838  13.919  5.722 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.485  7.406  10.432  3.838  25.161  7.830 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.514  9.338  13.120  4.869  30.842  8.547 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.559  13.195  18.476  6.995  42.226  9.651 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.608  19.035  26.556  10.263  59.462  1.084 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.664  28.762  39.997  15.939  88.362  1.221 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.705  38.547  53.483  21.767 117.503  1.319 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.805  77.782 107.477  46.253 235.317  1.555 × 10^{6}
100. TeV 1.000 × 10^{8} 3.838  97.453 134.508  58.955 294.753  1.631 × 10^{6}