Muons in n-butyl alcohol (C_{4}H_{9}OH)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.56663 & 0.810 & 59.9 & 0.10081 & 3.5139 & 0.1937 & 2.6439 & 3.2425 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.367  8.367  6.592 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.520  6.520  1.207 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.086  5.087  2.261 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.942  3.942  4.525 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.364  3.364  7.289 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.521  2.521  2.147 × 10^{1}
100. MeV 1.764 × 10^{2} 2.366  2.366  2.967 × 10^{1}
140. MeV 2.218 × 10^{2} 2.201  2.201  4.728 × 10^{1}
200. MeV 2.868 × 10^{2} 2.106  2.106  7.526 × 10^{1}
300. MeV 3.917 × 10^{2} 2.068  0.000  2.068  1.233 × 10^{2}
324. MeV 4.161 × 10^{2} 2.067  0.000  2.067 Minimum ionization
400. MeV 4.945 × 10^{2} 2.072  0.000  2.073  1.717 × 10^{2}
800. MeV 8.995 × 10^{2} 2.146  0.000  0.000  2.146  3.614 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.180  0.000  0.000  2.181  4.538 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.236  0.000  0.001  2.237  6.348 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.297  0.000  0.000  0.001  2.299  8.992 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.368  0.001  0.001  0.001  2.371  1.327 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.416  0.001  0.001  0.002  2.421  1.744 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.529  0.003  0.003  0.004  2.538  3.353 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.563  0.004  0.004  0.005  2.576  4.135 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.612  0.006  0.007  0.007  2.632  5.671 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.663  0.009  0.011  0.009  2.692  7.923 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.717  0.016  0.019  0.014  2.765  1.159 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.754  0.022  0.028  0.018  2.822  1.516 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.840  0.050  0.068  0.035  2.993  2.890 × 10^{4}
100. GeV 1.001 × 10^{5} 2.866  0.065  0.089  0.043  3.064  3.551 × 10^{4}
140. GeV 1.401 × 10^{5} 2.906  0.097  0.134  0.060  3.197  4.828 × 10^{4}
200. GeV 2.001 × 10^{5} 2.948  0.146  0.206  0.085  3.384  6.652 × 10^{4}
300. GeV 3.001 × 10^{5} 2.995  0.230  0.328  0.127  3.680  9.484 × 10^{4}
400. GeV 4.001 × 10^{5} 3.028  0.318  0.455  0.169  3.970  1.210 × 10^{5}
800. GeV 8.001 × 10^{5} 3.109  0.685  0.985  0.341  5.120  2.095 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.135  0.875  1.259  0.429  5.698  2.465 × 10^{5}
1.22 TeV 1.216 × 10^{6} 3.159  1.080  1.553  0.525  6.318 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.176  1.257  1.805  0.608  6.846  3.104 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.219  1.845  2.643  0.881  8.588  3.885 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.268  2.832  4.037  1.350  11.488  4.889 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.304  3.837  5.453  1.827  14.420  5.664 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.392  7.909  11.154  3.815  26.270  7.690 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.421  9.970  14.027  4.839  32.257  8.376 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.465  14.084  19.749  6.951  44.249  9.430 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.512  20.311  28.382  10.196  62.402  1.057 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.567  30.680  42.744  15.832  92.825  1.187 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.607  41.110  57.154  21.619 123.491  1.280 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.705  82.932 114.845  45.921 247.402  1.505 × 10^{6}
100. TeV 1.000 × 10^{8} 3.737 103.900 143.725  58.525 309.887  1.577 × 10^{6}