Muons in molybdenum (Mo)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
42 (Mo) 95.95(1)  10.220  424.0 0.10525 3.2549 0.2267 3.2784 4.8793  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.836  4.836  1.175 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.820  3.820  2.114 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.017  3.017  3.901 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.366  2.366  7.693 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.034  2.034  1.228 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.547  1.547  3.551 × 10^{1}
100. MeV 1.764 × 10^{2} 1.460  1.460  4.885 × 10^{1}
140. MeV 2.218 × 10^{2} 1.377  1.377  7.718 × 10^{1}
200. MeV 2.868 × 10^{2} 1.336  1.336  1.216 × 10^{2}
252. MeV 3.421 × 10^{2} 1.329  1.330 Minimum ionization
300. MeV 3.917 × 10^{2} 1.333  0.000  0.000  1.333  1.967 × 10^{2}
400. MeV 4.945 × 10^{2} 1.350  0.000  0.000  1.351  2.712 × 10^{2}
800. MeV 8.995 × 10^{2} 1.433  0.001  0.000  1.434  5.584 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.466  0.001  0.000  1.467  6.962 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.518  0.001  0.000  0.001  1.521  9.638 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.575  0.002  0.001  0.001  1.579  1.351 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.639  0.004  0.003  0.001  1.647  1.970 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.683  0.006  0.005  0.002  1.696  2.568 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.782  0.015  0.015  0.003  1.816  4.839 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.812  0.020  0.021  0.004  1.857  5.928 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.854  0.031  0.034  0.006  1.925  8.042 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.897  0.048  0.055  0.008  2.008  1.109 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.942  0.078  0.096  0.011  2.128  1.593 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.972  0.110  0.141  0.015  2.239  2.051 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.040  0.248  0.337  0.030  2.656  3.688 × 10^{4}
100. GeV 1.001 × 10^{5} 2.061  0.322  0.442  0.037  2.863  4.413 × 10^{4}
140. GeV 1.401 × 10^{5} 2.092  0.472  0.660  0.051  3.277  5.719 × 10^{4}
200. GeV 2.001 × 10^{5} 2.124  0.708  1.005  0.073  3.911  7.393 × 10^{4}
235. GeV 2.352 × 10^{5} 2.138  0.848  1.205  0.086  4.278 Muon critical energy
300. GeV 3.001 × 10^{5} 2.160  1.111  1.583  0.109  4.964  9.658 × 10^{4}
400. GeV 4.001 × 10^{5} 2.186  1.528  2.181  0.146  6.041  1.148 × 10^{5}
800. GeV 8.001 × 10^{5} 2.248  3.249  4.635  0.295  10.428  1.646 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.269  4.134  5.891  0.370  12.665  1.820 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.300  5.908  8.397  0.524  17.130  2.091 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.333  8.622  12.222  0.759  23.937  2.386 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.372  13.155  18.578  1.160  35.266  2.728 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.399  17.751  25.004  1.568  46.722  2.974 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.467  36.284  50.836  3.259  92.848  3.569 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.489  45.626  63.823  4.128 116.068  3.761 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.523  64.260  89.734  5.912 162.431  4.051 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.560  92.382 128.770  8.646 232.359  4.359 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.603 139.197 193.719  13.371 348.891  4.708 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.633 186.186 258.826  18.209 465.855  4.955 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.709 374.443 519.440  38.413 935.006  5.549 × 10^{5}
100. TeV 1.000 × 10^{8} 2.733 468.740 649.870  48.850 1170.194  5.740 × 10^{5}