Muons in m,n-dimethyl formamide (C_3H_6NOH)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.54724 0.949 66.6 0.11470 3.3710 0.1977 2.6686 3.3311 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.973 7.973 6.924 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.216 6.216 1.267 × 10^0 20.0 MeV 6.802 × 10^1 4.852 4.852 2.372 × 10^0 30.0 MeV 8.509 × 10^1 3.762 3.762 4.746 × 10^0 40.0 MeV 1.003 × 10^2 3.211 3.211 7.642 × 10^0 80.0 MeV 1.527 × 10^2 2.409 2.409 2.248 × 10^1 100. MeV 1.764 × 10^2 2.261 2.261 3.107 × 10^1 140. MeV 2.218 × 10^2 2.104 2.104 4.950 × 10^1 200. MeV 2.868 × 10^2 2.013 2.014 7.876 × 10^1 300. MeV 3.917 × 10^2 1.978 0.000 1.978 1.290 × 10^2 325. MeV 4.171 × 10^2 1.977 0.000 1.977 Minimum ionization 400. MeV 4.945 × 10^2 1.983 0.000 1.983 1.796 × 10^2 800. MeV 8.995 × 10^2 2.056 0.000 0.000 2.056 3.777 × 10^2 1.00 GeV 1.101 × 10^3 2.089 0.000 0.000 2.090 4.741 × 10^2 1.40 GeV 1.502 × 10^3 2.144 0.000 0.001 2.145 6.629 × 10^2 2.00 GeV 2.103 × 10^3 2.205 0.001 0.000 0.001 2.206 9.385 × 10^2 3.00 GeV 3.104 × 10^3 2.273 0.001 0.001 0.001 2.276 1.384 × 10^3 4.00 GeV 4.104 × 10^3 2.321 0.001 0.001 0.002 2.325 1.819 × 10^3 8.00 GeV 8.105 × 10^3 2.431 0.003 0.003 0.004 2.441 3.493 × 10^3 10.0 GeV 1.011 × 10^4 2.464 0.004 0.004 0.005 2.477 4.306 × 10^3 14.0 GeV 1.411 × 10^4 2.512 0.006 0.007 0.007 2.532 5.902 × 10^3 20.0 GeV 2.011 × 10^4 2.561 0.010 0.011 0.009 2.592 8.242 × 10^3 30.0 GeV 3.011 × 10^4 2.614 0.016 0.020 0.014 2.664 1.205 × 10^4 40.0 GeV 4.011 × 10^4 2.650 0.023 0.029 0.018 2.720 1.576 × 10^4 80.0 GeV 8.011 × 10^4 2.732 0.053 0.071 0.034 2.890 3.000 × 10^4 100. GeV 1.001 × 10^5 2.758 0.068 0.093 0.043 2.963 3.684 × 10^4 140. GeV 1.401 × 10^5 2.796 0.101 0.140 0.059 3.097 5.004 × 10^4 200. GeV 2.001 × 10^5 2.836 0.152 0.215 0.084 3.288 6.883 × 10^4 300. GeV 3.001 × 10^5 2.882 0.240 0.342 0.126 3.590 9.792 × 10^4 400. GeV 4.001 × 10^5 2.914 0.332 0.474 0.168 3.888 1.247 × 10^5 800. GeV 8.001 × 10^5 2.992 0.713 1.026 0.339 5.071 2.145 × 10^5 1.00 TeV 1.000 × 10^6 3.018 0.911 1.312 0.426 5.667 2.518 × 10^5 1.14 TeV 1.135 × 10^6 3.032 1.044 1.502 0.486 6.065 Muon critical energy 1.40 TeV 1.400 × 10^6 3.057 1.308 1.880 0.605 6.849 3.159 × 10^5 2.00 TeV 2.000 × 10^6 3.098 1.919 2.751 0.876 8.644 3.937 × 10^5 3.00 TeV 3.000 × 10^6 3.146 2.944 4.201 1.342 11.634 4.931 × 10^5 4.00 TeV 4.000 × 10^6 3.181 3.987 5.673 1.816 14.657 5.695 × 10^5 8.00 TeV 8.000 × 10^6 3.266 8.212 11.600 3.792 26.871 7.681 × 10^5 10.0 TeV 1.000 × 10^7 3.293 10.350 14.586 4.810 33.040 8.351 × 10^5 14.0 TeV 1.400 × 10^7 3.336 14.617 20.535 6.908 45.396 9.380 × 10^5 20.0 TeV 2.000 × 10^7 3.382 21.073 29.508 10.132 64.096 1.049 × 10^6 30.0 TeV 3.000 × 10^7 3.435 31.825 44.438 15.730 95.428 1.176 × 10^6 40.0 TeV 4.000 × 10^7 3.473 42.636 59.417 21.476 127.002 1.266 × 10^6 80.0 TeV 8.000 × 10^7 3.568 85.987 119.384 45.601 254.540 1.485 × 10^6 100. TeV 1.000 × 10^8 3.599 107.721 149.404 58.111 318.835 1.555 × 10^6