Muons in m,n-dimethyl formamide (C_{3}H_{6}NOH)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54724 & 0.949 & 66.6 & 0.11470 & 3.3710 & 0.1977 & 2.6686 & 3.3311 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.973  7.973  6.924 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.216  6.216  1.267 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.852  4.852  2.372 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.762  3.762  4.746 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.211  3.211  7.642 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.409  2.409  2.248 × 10^{1}
100. MeV 1.764 × 10^{2} 2.261  2.261  3.107 × 10^{1}
140. MeV 2.218 × 10^{2} 2.104  2.104  4.950 × 10^{1}
200. MeV 2.868 × 10^{2} 2.013  2.014  7.876 × 10^{1}
300. MeV 3.917 × 10^{2} 1.978  0.000  1.978  1.290 × 10^{2}
325. MeV 4.171 × 10^{2} 1.977  0.000  1.977 Minimum ionization
400. MeV 4.945 × 10^{2} 1.983  0.000  1.983  1.796 × 10^{2}
800. MeV 8.995 × 10^{2} 2.056  0.000  0.000  2.056  3.777 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.089  0.000  0.000  2.090  4.741 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.144  0.000  0.001  2.145  6.629 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.205  0.001  0.000  0.001  2.206  9.385 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.273  0.001  0.001  0.001  2.276  1.384 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.321  0.001  0.001  0.002  2.325  1.819 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.431  0.003  0.003  0.004  2.441  3.493 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.464  0.004  0.004  0.005  2.477  4.306 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.512  0.006  0.007  0.007  2.532  5.902 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.561  0.010  0.011  0.009  2.592  8.242 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.614  0.016  0.020  0.014  2.664  1.205 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.650  0.023  0.029  0.018  2.720  1.576 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.732  0.053  0.071  0.034  2.890  3.000 × 10^{4}
100. GeV 1.001 × 10^{5} 2.758  0.068  0.093  0.043  2.963  3.684 × 10^{4}
140. GeV 1.401 × 10^{5} 2.796  0.101  0.140  0.059  3.097  5.004 × 10^{4}
200. GeV 2.001 × 10^{5} 2.836  0.152  0.215  0.084  3.288  6.883 × 10^{4}
300. GeV 3.001 × 10^{5} 2.882  0.240  0.342  0.126  3.590  9.792 × 10^{4}
400. GeV 4.001 × 10^{5} 2.914  0.332  0.474  0.168  3.888  1.247 × 10^{5}
800. GeV 8.001 × 10^{5} 2.992  0.713  1.026  0.339  5.071  2.145 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.018  0.911  1.312  0.426  5.667  2.518 × 10^{5}
1.14 TeV 1.135 × 10^{6} 3.032  1.044  1.502  0.486  6.065 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.057  1.308  1.880  0.605  6.849  3.159 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.098  1.919  2.751  0.876  8.644  3.937 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.146  2.944  4.201  1.342  11.634  4.931 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.181  3.987  5.673  1.816  14.657  5.695 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.266  8.212  11.600  3.792  26.871  7.681 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.293  10.350  14.586  4.810  33.040  8.351 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.336  14.617  20.535  6.908  45.396  9.380 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.382  21.073  29.508  10.132  64.096  1.049 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.435  31.825  44.438  15.730  95.428  1.176 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.473  42.636  59.417  21.476 127.002  1.266 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.568  85.987 119.384  45.601 254.540  1.485 × 10^{6}
100. TeV 1.000 × 10^{8} 3.599 107.721 149.404  58.111 318.835  1.555 × 10^{6}