Muons in mercury (Hg)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
80 (Hg) 200.592(2) 13.546  800.0 0.11014 3.0519 0.2756 3.7275 5.9605  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.877  3.878  1.500 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.095  3.095  2.665 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.467  2.467  4.858 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.951  1.951  9.474 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.685  1.685  1.502 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.295  1.295  4.290 × 10^{1}
100. MeV 1.764 × 10^{2} 1.226  1.226  5.880 × 10^{1}
140. MeV 2.218 × 10^{2} 1.161  1.161  9.248 × 10^{1}
200. MeV 2.868 × 10^{2} 1.133  1.133  1.450 × 10^{2}
233. MeV 3.220 × 10^{2} 1.130  0.000  1.131 Minimum ionization
300. MeV 3.917 × 10^{2} 1.137  0.000  0.000  1.137  2.333 × 10^{2}
400. MeV 4.945 × 10^{2} 1.157  0.000  0.000  1.158  3.204 × 10^{2}
800. MeV 8.995 × 10^{2} 1.241  0.001  0.000  1.242  6.534 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.274  0.001  0.000  1.276  8.122 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.326  0.002  0.001  1.329  1.119 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.382  0.004  0.001  0.001  1.388  1.560 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.445  0.007  0.003  0.001  1.457  2.263 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.489  0.010  0.006  0.002  1.507  2.937 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.588  0.025  0.022  0.003  1.638  5.473 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.617  0.033  0.031  0.004  1.685  6.676 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.660  0.050  0.051  0.005  1.766  8.993 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.702  0.078  0.083  0.007  1.872  1.229 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.747  0.128  0.146  0.011  2.033  1.741 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.777  0.180  0.216  0.014  2.188  2.215 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.844  0.408  0.522  0.028  2.802  3.826 × 10^{4}
100. GeV 1.001 × 10^{5} 1.864  0.528  0.687  0.035  3.114  4.503 × 10^{4}
140. GeV 1.401 × 10^{5} 1.893  0.775  1.027  0.048  3.744  5.674 × 10^{4}
143. GeV 1.430 × 10^{5} 1.895  0.794  1.052  0.049  3.791 Muon critical energy
200. GeV 2.001 × 10^{5} 1.923  1.162  1.565  0.068  4.719  7.099 × 10^{4}
300. GeV 3.001 × 10^{5} 1.957  1.821  2.464  0.103  6.345  8.921 × 10^{4}
400. GeV 4.001 × 10^{5} 1.980  2.502  3.395  0.137  8.016  1.032 × 10^{5}
800. GeV 8.001 × 10^{5} 2.037  5.312  7.213  0.277  14.841  1.393 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.056  6.755  9.166  0.347  18.326  1.514 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.084  9.645  13.060  0.492  25.283  1.700 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.114  14.063  19.002  0.712  35.893  1.898 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.149  21.436  28.874  1.088  53.548  2.124 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.175  28.903  38.850  1.469  71.398  2.286 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.236  58.993  78.945  3.050 143.227  2.673 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.257  74.149  99.097  3.862 179.367  2.798 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.288 104.379 139.309  5.526 251.504  2.985 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.321 149.976 199.880  8.076 360.255  3.184 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.360 225.885 300.651  12.479 541.377  3.409 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.388 302.052 401.654  16.984 723.080  3.568 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.457 607.127 805.944  35.784 1451.313  3.951 × 10^{5}
100. TeV 1.000 × 10^{8} 2.479 759.900 1008.270  45.490 1816.141  4.074 × 10^{5}