Muons in manganese (Mn)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
25 (Mn) 54.938044(3) 7.440  272.0 0.14973 2.9796 0.0447 3.1074 4.2702  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.414  5.414  1.039 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.257  4.257  1.881 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.347  3.347  3.488 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.613  2.613  6.915 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.239  2.239  1.108 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.689  1.689  3.229 × 10^{1}
100. MeV 1.764 × 10^{2} 1.590  1.590  4.452 × 10^{1}
140. MeV 2.218 × 10^{2} 1.491  1.492  7.061 × 10^{1}
200. MeV 2.868 × 10^{2} 1.440  1.440  1.117 × 10^{2}
274. MeV 3.642 × 10^{2} 1.428  0.000  1.428 Minimum ionization
300. MeV 3.917 × 10^{2} 1.429  0.000  1.429  1.816 × 10^{2}
400. MeV 4.945 × 10^{2} 1.443  0.000  0.000  1.443  2.513 × 10^{2}
800. MeV 8.995 × 10^{2} 1.521  0.000  0.000  1.522  5.210 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.554  0.001  0.000  1.555  6.509 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.607  0.001  0.000  0.001  1.609  9.036 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.664  0.002  0.001  0.001  1.667  1.270 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.728  0.003  0.002  0.001  1.735  1.857 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.773  0.004  0.003  0.002  1.782  2.425 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.875  0.010  0.010  0.003  1.898  4.592 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.905  0.013  0.014  0.004  1.937  5.635 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.949  0.020  0.022  0.006  1.997  7.667 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.993  0.031  0.036  0.008  2.069  1.062 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.040  0.050  0.063  0.012  2.165  1.534 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.071  0.071  0.092  0.016  2.250  1.987 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.141  0.161  0.220  0.031  2.553  3.653 × 10^{4}
100. GeV 1.001 × 10^{5} 2.162  0.209  0.289  0.038  2.699  4.414 × 10^{4}
140. GeV 1.401 × 10^{5} 2.194  0.306  0.432  0.054  2.987  5.823 × 10^{4}
200. GeV 2.001 × 10^{5} 2.228  0.460  0.658  0.076  3.422  7.698 × 10^{4}
300. GeV 3.001 × 10^{5} 2.265  0.722  1.038  0.114  4.140  1.035 × 10^{5}
358. GeV 3.585 × 10^{5} 2.282  0.879  1.267  0.136  4.565 Muon critical energy
400. GeV 4.001 × 10^{5} 2.292  0.993  1.432  0.152  4.870  1.258 × 10^{5}
800. GeV 8.001 × 10^{5} 2.357  2.115  3.051  0.307  7.832  1.900 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.378  2.693  3.881  0.386  9.339  2.133 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.411  3.852  5.537  0.547  12.348  2.505 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.445  5.627  8.067  0.792  16.932  2.918 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.485  8.593  12.272  1.212  24.564  3.406 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.514  11.603  16.525  1.639  32.282  3.760 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.584  23.751  33.630  3.410  63.377  4.628 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.608  29.878  42.233  4.321  79.040  4.910 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.643  42.101  59.394  6.192 110.331  5.336 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.681  60.556  85.254  9.062 157.554  5.789 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.725  91.279 128.281  14.027 236.313  6.304 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.757 122.126 171.419  19.113 315.416  6.669 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.836 245.739 344.102  40.383 633.061  7.546 × 10^{5}
100. TeV 1.000 × 10^{8} 2.861 307.670 430.530  51.380 792.442  7.828 × 10^{5}