Muons in magnesium (Mg)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
12 (Mg) 24.305(6)  1.740  156.0 0.08163 3.6166 0.1499 3.0668 4.5297  0.08
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.400  6.400  8.717 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.013  5.013  1.585 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.930  3.930  2.952 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.060  3.060  5.876 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.618  2.618  9.432 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.973  1.973  2.759 × 10^{1}
100. MeV 1.764 × 10^{2} 1.860  1.860  3.805 × 10^{1}
140. MeV 2.218 × 10^{2} 1.748  1.748  6.033 × 10^{1}
200. MeV 2.868 × 10^{2} 1.689  1.689  9.537 × 10^{1}
274. MeV 3.642 × 10^{2} 1.674  0.000  1.674 Minimum ionization
300. MeV 3.917 × 10^{2} 1.675  0.000  1.675  1.550 × 10^{2}
400. MeV 4.945 × 10^{2} 1.690  0.000  1.691  2.144 × 10^{2}
800. MeV 8.995 × 10^{2} 1.775  0.000  0.000  1.776  4.451 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.811  0.000  0.000  1.811  5.566 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.867  0.001  0.000  0.001  1.868  7.739 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.927  0.001  0.000  0.001  1.929  1.090 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.995  0.002  0.001  0.001  1.999  1.598 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.042  0.002  0.002  0.002  2.048  2.092 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.147  0.006  0.005  0.004  2.162  3.987 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.179  0.007  0.007  0.005  2.198  4.904 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.225  0.011  0.012  0.006  2.254  6.699 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.270  0.017  0.020  0.009  2.316  9.323 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.319  0.028  0.035  0.013  2.395  1.357 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.352  0.040  0.051  0.017  2.460  1.768 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.427  0.091  0.123  0.033  2.673  3.326 × 10^{4}
100. GeV 1.001 × 10^{5} 2.450  0.117  0.161  0.041  2.770  4.060 × 10^{4}
140. GeV 1.401 × 10^{5} 2.485  0.173  0.242  0.057  2.956  5.458 × 10^{4}
200. GeV 2.001 × 10^{5} 2.521  0.260  0.369  0.080  3.230  7.399 × 10^{4}
300. GeV 3.001 × 10^{5} 2.562  0.409  0.584  0.121  3.675  1.030 × 10^{5}
400. GeV 4.001 × 10^{5} 2.591  0.563  0.807  0.161  4.122  1.287 × 10^{5}
659. GeV 6.587 × 10^{5} 2.642  0.973  1.402  0.266  5.284 Muon critical energy
800. GeV 8.001 × 10^{5} 2.662  1.203  1.734  0.325  5.923  2.092 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.685  1.532  2.212  0.408  6.837  2.406 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.719  2.196  3.161  0.578  8.655  2.925 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.757  3.213  4.612  0.837  11.420  3.527 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.800  4.915  7.028  1.282  16.026  4.263 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.831  6.645  9.473  1.734  20.684  4.811 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.908  13.634  19.318  3.615  39.476  6.187 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.933  17.164  24.272  4.583  48.953  6.641 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.972  24.212  34.147  6.575  67.906  7.332 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.013  34.864  49.034  9.632  96.544  8.069 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.061  52.576  73.814  14.931 144.383  8.911 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.095  70.366  98.667  20.365 192.495  9.509 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.181 141.708 198.154  43.132 386.176  1.095 × 10^{6}
100. TeV 1.000 × 10^{8} 3.209 177.470 247.950  54.920 483.549  1.141 × 10^{6}