Muons in lutetium (Lu)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
71 (Lu) 174.9668(1) 9.841  694.0 0.24033 2.5643 0.1560 3.5218 5.9784  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.072  4.072  1.417 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.240  3.240  2.529 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.575  2.575  4.628 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.030  2.030  9.058 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.751  1.751  1.439 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.339  1.339  4.130 × 10^{1}
100. MeV 1.764 × 10^{2} 1.266  1.266  5.669 × 10^{1}
140. MeV 2.218 × 10^{2} 1.196  1.197  8.933 × 10^{1}
200. MeV 2.868 × 10^{2} 1.164  1.164  1.403 × 10^{2}
237. MeV 3.260 × 10^{2} 1.160  0.000  1.161 Minimum ionization
300. MeV 3.917 × 10^{2} 1.165  0.000  0.000  1.166  2.264 × 10^{2}
400. MeV 4.945 × 10^{2} 1.185  0.000  0.000  1.185  3.115 × 10^{2}
800. MeV 8.995 × 10^{2} 1.268  0.001  0.000  1.269  6.372 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.301  0.001  0.000  1.303  7.927 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.354  0.002  0.000  0.001  1.357  1.093 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.412  0.004  0.001  0.001  1.417  1.525 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.477  0.006  0.003  0.001  1.488  2.213 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.522  0.009  0.006  0.002  1.539  2.873 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.625  0.023  0.021  0.003  1.672  5.356 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.657  0.030  0.029  0.004  1.720  6.534 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.701  0.046  0.047  0.005  1.801  8.805 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.746  0.071  0.078  0.007  1.903  1.204 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.793  0.116  0.137  0.011  2.058  1.709 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.825  0.164  0.201  0.014  2.205  2.178 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.894  0.372  0.484  0.028  2.779  3.790 × 10^{4}
100. GeV 1.001 × 10^{5} 1.915  0.482  0.637  0.035  3.070  4.475 × 10^{4}
140. GeV 1.401 × 10^{5} 1.945  0.707  0.952  0.049  3.654  5.668 × 10^{4}
157. GeV 1.575 × 10^{5} 1.955  0.808  1.093  0.055  3.912 Muon critical energy
200. GeV 2.001 × 10^{5} 1.976  1.060  1.450  0.069  4.556  7.137 × 10^{4}
300. GeV 3.001 × 10^{5} 2.010  1.661  2.282  0.104  6.058  9.035 × 10^{4}
400. GeV 4.001 × 10^{5} 2.034  2.283  3.144  0.139  7.601  1.051 × 10^{5}
800. GeV 8.001 × 10^{5} 2.092  4.849  6.677  0.280  13.900  1.434 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.111  6.166  8.485  0.352  17.115  1.564 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.139  8.806  12.089  0.498  23.534  1.762 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.170  12.842  17.588  0.720  33.323  1.976 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.206  19.578  26.726  1.101  49.612  2.220 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.231  26.401  35.960  1.488  66.082  2.394 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.294  53.901  73.075  3.090 132.361  2.813 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.315  67.754  91.729  3.912 165.712  2.948 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.347  95.386 128.951  5.598 232.284  3.151 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.381 137.068 185.020  8.182 332.652  3.366 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.420 206.458 278.307  12.645 499.831  3.609 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.448 276.088 371.810  17.211 667.559  3.782 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.518 554.989 746.078  36.270 1339.857  4.196 × 10^{5}
100. TeV 1.000 × 10^{8} 2.541 694.660 933.380  46.110 1676.693  4.330 × 10^{5}