Muons in lithium (Li)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
3 (Li)  6.94(2)  0.534  40.0 0.95136 2.4993 0.1304 1.6397 3.1221  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.698  6.698  8.207 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.209  5.209  1.505 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.055  4.055  2.826 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.134  3.135  5.671 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.669  2.669  9.151 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.988  1.988  2.708 × 10^{1}
100. MeV 1.764 × 10^{2} 1.865  1.865  3.750 × 10^{1}
140. MeV 2.218 × 10^{2} 1.739  1.739  5.981 × 10^{1}
200. MeV 2.868 × 10^{2} 1.667  1.667  9.519 × 10^{1}
300. MeV 3.917 × 10^{2} 1.639  0.000  1.639  1.559 × 10^{2}
318. MeV 4.105 × 10^{2} 1.639  0.000  1.639 Minimum ionization
400. MeV 4.945 × 10^{2} 1.643  0.000  1.644  2.168 × 10^{2}
800. MeV 8.995 × 10^{2} 1.701  0.000  1.701  4.561 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.727  0.000  1.727  5.727 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.768  0.000  0.001  1.769  8.014 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.813  0.000  0.001  1.814  1.136 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.863  0.000  0.000  0.002  1.865  1.679 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.897  0.001  0.000  0.002  1.900  2.210 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.977  0.001  0.001  0.004  1.984  4.265 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.002  0.002  0.002  0.005  2.011  5.266 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.039  0.003  0.003  0.007  2.052  7.235 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.077  0.005  0.005  0.009  2.096  1.013 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.118  0.008  0.009  0.014  2.149  1.483 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.146  0.011  0.014  0.018  2.189  1.944 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.212  0.025  0.034  0.035  2.305  3.722 × 10^{4}
100. GeV 1.001 × 10^{5} 2.232  0.032  0.045  0.043  2.353  4.580 × 10^{4}
140. GeV 1.401 × 10^{5} 2.262  0.048  0.067  0.060  2.438  6.250 × 10^{4}
200. GeV 2.001 × 10^{5} 2.294  0.073  0.103  0.086  2.556  8.653 × 10^{4}
300. GeV 3.001 × 10^{5} 2.330  0.115  0.165  0.128  2.739  1.243 × 10^{5}
400. GeV 4.001 × 10^{5} 2.355  0.160  0.230  0.171  2.916  1.597 × 10^{5}
800. GeV 8.001 × 10^{5} 2.417  0.346  0.502  0.346  3.611  2.827 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.437  0.443  0.643  0.435  3.959  3.356 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.468  0.638  0.925  0.617  4.649  4.287 × 10^{5}
1.58 TeV 1.578 × 10^{6} 2.479  0.727  1.053  0.699  4.958 Muon critical energy
2.00 TeV 2.000 × 10^{6} 2.501  0.940  1.360  0.894  5.695  5.451 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.539  1.446  2.085  1.371  7.441  6.983 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.566  1.962  2.823  1.857  9.207  8.190 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.633  4.057  5.799  3.881  16.370  1.141 × 10^{6}
10.0 TeV 1.000 × 10^{7} 2.655  5.119  7.301  4.924  19.999  1.251 × 10^{6}
14.0 TeV 1.400 × 10^{7} 2.689  7.239  10.291  7.075  27.293  1.421 × 10^{6}
20.0 TeV 2.000 × 10^{7} 2.725  10.450  14.806  10.382  38.363  1.606 × 10^{6}
30.0 TeV 3.000 × 10^{7} 2.767  15.797  22.311  16.131  57.006  1.819 × 10^{6}
40.0 TeV 4.000 × 10^{7} 2.797  21.178  29.845  22.035  75.855  1.970 × 10^{6}
80.0 TeV 8.000 × 10^{7} 2.871  42.758  60.014  46.852 152.495  2.335 × 10^{6}
100. TeV 1.000 × 10^{8} 2.896  53.580  75.120  59.730 191.326  2.452 × 10^{6}