Muons in liquid hydrogen (H_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
1 (H)  1.008(7) 7.080 × 10^{−2} 21.8 0.13483 5.6249 0.4400 1.8856 3.0977  0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 16.508  16.508  3.316 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 12.812  12.812  6.097 × 10^{−1}
20.0 MeV 6.802 × 10^{1} 9.956  9.956  1.147 × 10^{0}
30.0 MeV 8.509 × 10^{1} 7.684  7.684  2.307 × 10^{0}
40.0 MeV 1.003 × 10^{2} 6.539  6.539  3.727 × 10^{0}
80.0 MeV 1.527 × 10^{2} 4.870  4.870  1.105 × 10^{1}
100. MeV 1.764 × 10^{2} 4.568  4.568  1.530 × 10^{1}
140. MeV 2.218 × 10^{2} 4.267  4.267  2.440 × 10^{1}
200. MeV 2.868 × 10^{2} 4.104  0.000  4.104  3.879 × 10^{1}
300. MeV 3.917 × 10^{2} 4.037  0.000  4.038  6.342 × 10^{1}
344. MeV 4.372 × 10^{2} 4.034  0.000  4.034 Minimum ionization
400. MeV 4.945 × 10^{2} 4.038  0.000  4.038  8.820 × 10^{1}
800. MeV 8.995 × 10^{2} 4.134  0.000  4.135  1.862 × 10^{2}
1.00 GeV 1.101 × 10^{3} 4.182  0.001  4.182  2.342 × 10^{2}
1.40 GeV 1.502 × 10^{3} 4.261  0.000  0.001  4.262  3.289 × 10^{2}
2.00 GeV 2.103 × 10^{3} 4.352  0.000  0.001  4.353  4.682 × 10^{2}
3.00 GeV 3.104 × 10^{3} 4.459  0.000  0.000  0.002  4.461  6.949 × 10^{2}
4.00 GeV 4.104 × 10^{3} 4.536  0.001  0.000  0.002  4.539  9.170 × 10^{2}
8.00 GeV 8.105 × 10^{3} 4.719  0.001  0.001  0.005  4.726  1.779 × 10^{3}
10.0 GeV 1.011 × 10^{4} 4.777  0.002  0.002  0.006  4.786  2.199 × 10^{3}
14.0 GeV 1.411 × 10^{4} 4.861  0.003  0.003  0.008  4.876  3.027 × 10^{3}
20.0 GeV 2.011 × 10^{4} 4.948  0.005  0.006  0.011  4.969  4.245 × 10^{3}
30.0 GeV 3.011 × 10^{4} 5.043  0.008  0.010  0.015  5.077  6.234 × 10^{3}
40.0 GeV 4.011 × 10^{4} 5.108  0.012  0.015  0.020  5.155  8.188 × 10^{3}
80.0 GeV 8.011 × 10^{4} 5.258  0.028  0.038  0.038  5.362  1.578 × 10^{4}
100. GeV 1.001 × 10^{5} 5.305  0.037  0.050  0.047  5.439  1.949 × 10^{4}
140. GeV 1.401 × 10^{5} 5.374  0.055  0.076  0.066  5.572  2.675 × 10^{4}
200. GeV 2.001 × 10^{5} 5.447  0.085  0.118  0.093  5.743  3.735 × 10^{4}
300. GeV 3.001 × 10^{5} 5.529  0.137  0.191  0.139  5.996  5.439 × 10^{4}
400. GeV 4.001 × 10^{5} 5.588  0.191  0.268  0.185  6.232  7.074 × 10^{4}
800. GeV 8.001 × 10^{5} 5.730  0.423  0.592  0.373  7.117  1.307 × 10^{5}
1.00 TeV 1.000 × 10^{6} 5.776  0.544  0.761  0.468  7.549  1.580 × 10^{5}
1.40 TeV 1.400 × 10^{6} 5.846  0.791  1.101  0.663  8.402  2.082 × 10^{5}
2.00 TeV 2.000 × 10^{6} 5.921  1.175  1.627  0.961  9.684  2.747 × 10^{5}
3.00 TeV 3.000 × 10^{6} 6.008  1.827  2.504  1.474  11.813  3.680 × 10^{5}
3.10 TeV 3.102 × 10^{6} 6.016  1.894  2.595  1.527  12.032 Muon critical energy
4.00 TeV 4.000 × 10^{6} 6.071  2.496  3.399  1.996  13.962  4.458 × 10^{5}
8.00 TeV 8.000 × 10^{6} 6.225  5.240  7.012  4.180  22.658  6.686 × 10^{5}
10.0 TeV 1.000 × 10^{7} 6.276  6.642  8.837  5.308  27.063  7.493 × 10^{5}
14.0 TeV 1.400 × 10^{7} 6.353  9.452  12.466  7.642  35.913  8.772 × 10^{5}
20.0 TeV 2.000 × 10^{7} 6.436  13.734  17.952  11.236  49.358  1.019 × 10^{6}
30.0 TeV 3.000 × 10^{7} 6.532  20.884  27.062  17.498  71.976  1.186 × 10^{6}
40.0 TeV 4.000 × 10^{7} 6.602  28.113  36.210  23.940  94.863  1.307 × 10^{6}
80.0 TeV 8.000 × 10^{7} 6.773  57.248  72.833  51.135 187.988  1.601 × 10^{6}
100. TeV 1.000 × 10^{8} 6.829  71.920  91.170  65.290 235.209  1.696 × 10^{6}