Muons in lead glass

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42101 & 6.220 & 526.4 & 0.09544 & 3.0740 & 0.0614 & 3.8146 & 5.8476 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.518  4.518  1.254 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.569  3.569  2.260 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.820  2.820  4.172 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.215  2.215  8.226 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.906  1.906  1.312 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.456  1.456  3.785 × 10^{1}
100. MeV 1.764 × 10^{2} 1.376  1.376  5.202 × 10^{1}
140. MeV 2.218 × 10^{2} 1.298  1.298  8.208 × 10^{1}
200. MeV 2.868 × 10^{2} 1.260  1.261  1.291 × 10^{2}
247. MeV 3.366 × 10^{2} 1.255  0.000  1.256 Minimum ionization
300. MeV 3.917 × 10^{2} 1.259  0.000  0.000  1.260  2.087 × 10^{2}
400. MeV 4.945 × 10^{2} 1.278  0.000  0.000  1.278  2.875 × 10^{2}
800. MeV 8.995 × 10^{2} 1.362  0.001  0.000  1.363  5.902 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.395  0.001  0.000  1.397  7.350 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.449  0.002  0.001  1.452  1.016 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.507  0.003  0.001  0.001  1.512  1.420 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.573  0.006  0.003  0.001  1.583  2.065 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.618  0.008  0.005  0.002  1.634  2.687 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.722  0.020  0.018  0.003  1.764  5.034 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.753  0.027  0.025  0.004  1.810  6.153 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.798  0.041  0.041  0.006  1.886  8.317 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.843  0.063  0.068  0.008  1.982  1.142 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.890  0.104  0.119  0.011  2.125  1.629 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.922  0.146  0.175  0.015  2.259  2.085 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.992  0.331  0.424  0.029  2.778  3.678 × 10^{4}
100. GeV 1.001 × 10^{5} 2.014  0.429  0.558  0.036  3.038  4.366 × 10^{4}
140. GeV 1.401 × 10^{5} 2.045  0.630  0.835  0.050  3.561  5.582 × 10^{4}
183. GeV 1.834 × 10^{5} 2.069  0.855  1.148  0.066  4.139 Muon critical energy
200. GeV 2.001 × 10^{5} 2.077  0.944  1.273  0.071  4.366  7.101 × 10^{4}
300. GeV 3.001 × 10^{5} 2.112  1.481  2.005  0.107  5.706  9.100 × 10^{4}
400. GeV 4.001 × 10^{5} 2.137  2.035  2.763  0.143  7.080  1.067 × 10^{5}
800. GeV 8.001 × 10^{5} 2.197  4.323  5.876  0.289  12.686  1.484 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.217  5.498  7.468  0.363  15.547  1.626 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.247  7.852  10.643  0.514  21.257  1.845 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.279  11.451  15.489  0.743  29.964  2.082 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.316  17.457  23.542  1.137  44.453  2.354 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.342  23.542  31.680  1.536  59.103  2.549 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.408  48.067  64.393  3.194 118.063  3.018 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.429  60.423  80.835  4.045 147.733  3.169 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.462  85.066 113.643  5.793 206.965  3.397 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.497 122.241 163.063  8.472 296.276  3.638 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.538 184.128 245.288  13.104 445.059  3.911 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.567 246.230 327.705  17.845 594.349  4.105 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.640 494.978 657.607  37.658 1192.885  4.571 × 10^{5}
100. TeV 1.000 × 10^{8} 2.664 619.549 822.710  47.896 1492.821  4.720 × 10^{5}