Muons in lead (Pb)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
82 (Pb) 207.2(1)  11.350  823.0 0.09359 3.1608 0.3776 3.8073 6.2018  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.823  3.823  1.524 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.054  3.054  2.705 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.436  2.436  4.927 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.928  1.928  9.600 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.666  1.666  1.521 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.283  1.283  4.338 × 10^{1}
100. MeV 1.764 × 10^{2} 1.215  1.215  5.943 × 10^{1}
140. MeV 2.218 × 10^{2} 1.151  1.152  9.339 × 10^{1}
200. MeV 2.868 × 10^{2} 1.124  1.124  1.463 × 10^{2}
226. MeV 3.145 × 10^{2} 1.122  0.000  1.123 Minimum ionization
300. MeV 3.917 × 10^{2} 1.130  0.000  0.000  1.131  2.352 × 10^{2}
400. MeV 4.945 × 10^{2} 1.151  0.000  0.000  1.152  3.228 × 10^{2}
800. MeV 8.995 × 10^{2} 1.237  0.001  0.000  1.238  6.572 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.270  0.001  0.000  1.272  8.165 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.322  0.002  0.001  1.325  1.124 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.379  0.004  0.001  0.001  1.385  1.567 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.442  0.007  0.003  0.001  1.454  2.270 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.486  0.010  0.006  0.002  1.504  2.946 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.585  0.025  0.022  0.003  1.636  5.486 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.615  0.033  0.031  0.004  1.683  6.691 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.657  0.051  0.051  0.005  1.765  9.009 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.700  0.079  0.084  0.007  1.871  1.231 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.744  0.129  0.148  0.011  2.033  1.743 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.774  0.183  0.218  0.014  2.190  2.217 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.840  0.414  0.527  0.028  2.810  3.825 × 10^{4}
100. GeV 1.001 × 10^{5} 1.860  0.536  0.694  0.034  3.126  4.500 × 10^{4}
140. GeV 1.401 × 10^{5} 1.889  0.787  1.038  0.048  3.763  5.665 × 10^{4}
141. GeV 1.412 × 10^{5} 1.890  0.794  1.048  0.048  3.782 Muon critical energy
200. GeV 2.001 × 10^{5} 1.919  1.179  1.583  0.068  4.750  7.082 × 10^{4}
300. GeV 3.001 × 10^{5} 1.953  1.848  2.492  0.102  6.396  8.891 × 10^{4}
400. GeV 4.001 × 10^{5} 1.976  2.539  3.434  0.136  8.088  1.028 × 10^{5}
800. GeV 8.001 × 10^{5} 2.033  5.391  7.297  0.276  14.998  1.386 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.051  6.854  9.273  0.346  18.526  1.505 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.079  9.787  13.212  0.491  25.570  1.688 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.109  14.269  19.223  0.709  36.313  1.884 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.144  21.749  29.210  1.084  54.189  2.109 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.169  29.324  39.302  1.465  72.262  2.268 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.230  59.850  79.864  3.041 144.988  2.651 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.251  75.226 100.251  3.850 181.580  2.774 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.281 105.893 140.930  5.510 254.615  2.959 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.315 152.148 202.204  8.052 364.721  3.155 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.353 229.154 304.148  12.440 548.097  3.377 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.381 306.420 406.326  16.930 732.059  3.534 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.449 615.890 815.326  35.667 1469.333  3.912 × 10^{5}
100. TeV 1.000 × 10^{8} 2.471 770.860 1020.010  45.340 1838.683  4.034 × 10^{5}