Muons in lanthanum (La)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
57 (La) 138.90547(7) 6.145  501.0 0.18591 2.8828 0.3164 3.3296 5.7865  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.404  4.404  1.295 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.485  3.485  2.326 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.757  2.757  4.282 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.166  2.166  8.428 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.864  1.864  1.344 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.423  1.423  3.874 × 10^{1}
100. MeV 1.764 × 10^{2} 1.344  1.344  5.324 × 10^{1}
140. MeV 2.218 × 10^{2} 1.269  1.269  8.400 × 10^{1}
200. MeV 2.868 × 10^{2} 1.235  1.235  1.321 × 10^{2}
239. MeV 3.285 × 10^{2} 1.231  1.231 Minimum ionization
300. MeV 3.917 × 10^{2} 1.236  0.000  0.000  1.236  2.132 × 10^{2}
400. MeV 4.945 × 10^{2} 1.255  0.000  0.000  1.256  2.935 × 10^{2}
800. MeV 8.995 × 10^{2} 1.340  0.001  0.000  1.341  6.013 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.373  0.001  0.000  1.375  7.485 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.426  0.002  0.000  0.001  1.429  1.034 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.484  0.003  0.001  0.001  1.489  1.444 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.548  0.005  0.003  0.001  1.558  2.100 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.592  0.008  0.006  0.002  1.608  2.731 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.692  0.019  0.018  0.003  1.733  5.119 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.722  0.025  0.025  0.004  1.777  6.258 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.765  0.038  0.041  0.005  1.850  8.463 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.808  0.059  0.067  0.008  1.941  1.163 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.852  0.096  0.116  0.011  2.077  1.660 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.882  0.136  0.171  0.015  2.204  2.128 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.948  0.307  0.410  0.029  2.695  3.765 × 10^{4}
100. GeV 1.001 × 10^{5} 1.968  0.398  0.539  0.036  2.942  4.475 × 10^{4}
140. GeV 1.401 × 10^{5} 1.997  0.584  0.804  0.050  3.437  5.733 × 10^{4}
188. GeV 1.881 × 10^{5} 2.022  0.817  1.139  0.066  4.045 Muon critical energy
200. GeV 2.001 × 10^{5} 2.027  0.876  1.225  0.071  4.200  7.310 × 10^{4}
300. GeV 3.001 × 10^{5} 2.061  1.374  1.927  0.106  5.469  9.392 × 10^{4}
400. GeV 4.001 × 10^{5} 2.086  1.888  2.655  0.141  6.771  1.103 × 10^{5}
800. GeV 8.001 × 10^{5} 2.144  4.013  5.639  0.286  12.083  1.540 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.163  5.104  7.165  0.359  14.793  1.689 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.192  7.291  10.209  0.508  20.203  1.920 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.224  10.637  14.855  0.735  28.452  2.169 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.260  16.222  22.575  1.124  42.182  2.456 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.285  21.881  30.377  1.519  56.064  2.661 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.349  44.695  61.738  3.155 111.939  3.156 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.370  56.191  77.502  3.995 140.059  3.315 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.402  79.120 108.956  5.719 196.199  3.555 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.436 113.714 156.338  8.362 280.852  3.810 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.476 171.306 235.172  12.925 421.882  4.098 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.505 229.104 314.192  17.595 563.398  4.303 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.576 460.633 630.488  37.092 1130.791  4.794 × 10^{5}
100. TeV 1.000 × 10^{8} 2.599 576.590 788.780  47.160 1415.130  4.952 × 10^{5}