Muons in krypton gas (Kr)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
36 (Kr) 83.798(2) 3.486 × 10^{−3} 352.0 0.07446 3.4051 1.7153 5.0743 12.5094 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.909  4.909  1.152 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.870  3.870  2.079 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.053  3.053  3.844 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.392  2.392  7.594 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.055  2.055  1.213 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.565  1.565  3.512 × 10^{1}
100. MeV 1.764 × 10^{2} 1.479  1.479  4.829 × 10^{1}
140. MeV 2.218 × 10^{2} 1.397  1.397  7.624 × 10^{1}
200. MeV 2.868 × 10^{2} 1.360  1.360  1.199 × 10^{2}
232. MeV 3.210 × 10^{2} 1.357  1.357 Minimum ionization
300. MeV 3.917 × 10^{2} 1.366  0.000  0.000  1.366  1.934 × 10^{2}
400. MeV 4.945 × 10^{2} 1.392  0.000  0.000  1.392  2.660 × 10^{2}
800. MeV 8.995 × 10^{2} 1.504  0.001  0.000  1.505  5.419 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.550  0.001  0.000  1.552  6.727 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.624  0.001  0.000  0.001  1.627  9.242 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.708  0.002  0.001  0.001  1.712  1.283 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.805  0.004  0.002  0.001  1.813  1.850 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.875  0.005  0.004  0.002  1.887  2.390 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.042  0.013  0.013  0.003  2.072  4.402 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.092  0.017  0.018  0.004  2.132  5.353 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.164  0.026  0.029  0.006  2.225  7.188 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.234  0.041  0.047  0.008  2.330  9.820 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.307  0.066  0.082  0.012  2.468  1.399 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.355  0.094  0.120  0.015  2.585  1.794 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.459  0.211  0.288  0.030  2.990  3.229 × 10^{4}
100. GeV 1.001 × 10^{5} 2.490  0.274  0.379  0.037  3.180  3.878 × 10^{4}
140. GeV 1.401 × 10^{5} 2.533  0.402  0.566  0.052  3.554  5.067 × 10^{4}
200. GeV 2.001 × 10^{5} 2.576  0.603  0.861  0.074  4.115  6.635 × 10^{4}
300. GeV 3.001 × 10^{5} 2.623  0.946  1.356  0.110  5.037  8.828 × 10^{4}
324. GeV 3.244 × 10^{5} 2.631  1.032  1.480  0.119  5.263 Muon critical energy
400. GeV 4.001 × 10^{5} 2.654  1.302  1.870  0.147  5.973  1.065 × 10^{5}
800. GeV 8.001 × 10^{5} 2.726  2.769  3.976  0.298  9.770  1.584 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.748  3.524  5.054  0.374  11.701  1.770 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.781  5.038  7.205  0.530  15.556  2.066 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.816  7.355  10.490  0.767  21.429  2.393 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.855  11.225  15.949  1.173  31.203  2.778 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.882  15.150  21.468  1.585  41.086  3.056 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.949  30.981  43.658  3.297  80.886  3.737 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.971  38.962  54.815  4.176 100.925  3.958 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.005  54.882  77.074  5.981 140.943  4.292 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.041  78.910 110.610  8.748 201.310  4.647 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.082 118.912 166.409  13.532 301.936  5.049 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.112 159.067 222.346  18.431 402.957  5.335 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.186 319.956 446.262  38.896 808.302  6.022 × 10^{5}
100. TeV 1.000 × 10^{8} 3.211 400.550 558.330  49.470 1011.562  6.243 × 10^{5}