Muons in iron (Fe)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
26 (Fe) 55.845(2)  7.874  286.0 0.14680 2.9632 −0.0012 3.1531 4.2911  0.12
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.494  5.494  1.025 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.321  4.321  1.854 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.399  3.399  3.437 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.654  2.654  6.812 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.274  2.274  1.091 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.717  1.717  3.178 × 10^{1}
100. MeV 1.764 × 10^{2} 1.616  1.616  4.382 × 10^{1}
140. MeV 2.218 × 10^{2} 1.516  1.516  6.950 × 10^{1}
200. MeV 2.868 × 10^{2} 1.463  1.463  1.099 × 10^{2}
274. MeV 3.642 × 10^{2} 1.451  0.000  1.451 Minimum ionization
300. MeV 3.917 × 10^{2} 1.452  0.000  1.453  1.787 × 10^{2}
400. MeV 4.945 × 10^{2} 1.467  0.000  0.000  1.467  2.472 × 10^{2}
800. MeV 8.995 × 10^{2} 1.548  0.000  0.000  1.548  5.124 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.581  0.001  0.000  1.582  6.402 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.635  0.001  0.000  0.001  1.637  8.885 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.694  0.002  0.001  0.001  1.697  1.248 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.760  0.003  0.002  0.001  1.766  1.825 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.806  0.004  0.003  0.002  1.816  2.383 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.911  0.010  0.010  0.003  1.935  4.509 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.942  0.014  0.014  0.004  1.975  5.532 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.987  0.021  0.023  0.006  2.038  7.524 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.032  0.033  0.038  0.008  2.112  1.041 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.080  0.054  0.066  0.012  2.213  1.504 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.112  0.076  0.097  0.016  2.302  1.946 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.184  0.171  0.233  0.031  2.620  3.572 × 10^{4}
100. GeV 1.001 × 10^{5} 2.207  0.221  0.306  0.038  2.773  4.314 × 10^{4}
140. GeV 1.401 × 10^{5} 2.239  0.325  0.458  0.054  3.076  5.683 × 10^{4}
200. GeV 2.001 × 10^{5} 2.273  0.488  0.698  0.076  3.535  7.501 × 10^{4}
300. GeV 3.001 × 10^{5} 2.312  0.766  1.100  0.114  4.293  1.006 × 10^{5}
347. GeV 3.470 × 10^{5} 2.326  0.900  1.294  0.132  4.652 Muon critical energy
400. GeV 4.001 × 10^{5} 2.339  1.053  1.517  0.152  5.063  1.221 × 10^{5}
800. GeV 8.001 × 10^{5} 2.406  2.244  3.232  0.307  8.190  1.836 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.428  2.856  4.111  0.386  9.781  2.060 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.461  4.085  5.864  0.547  12.958  2.414 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.496  5.967  8.543  0.791  17.798  2.807 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.537  9.112  12.996  1.211  25.856  3.271 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.566  12.302  17.499  1.637  34.005  3.607 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.638  25.178  35.609  3.406  66.833  4.431 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.662  31.673  44.716  4.316  83.368  4.698 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.698  44.628  62.884  6.184 116.397  5.103 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.737  64.188  90.262  9.050 166.238  5.532 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.783  96.751 135.814  14.009 249.357  6.020 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.815 129.444 181.483  19.089 332.833  6.366 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.895 260.455 364.300  40.329 667.981  7.197 × 10^{5}
100. TeV 1.000 × 10^{8} 2.922 326.090 455.800  51.310 836.123  7.464 × 10^{5}