Muons in iridium (Ir)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
77 (Ir) 192.217(3) 22.420  757.0 0.12690 2.9658 0.0819 3.5480 5.3418  0.10
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 3.944  3.944  1.470 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.143  3.143  2.616 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.502  2.502  4.778 × 10^{0}
30.0 MeV 8.509 × 10^{1} 1.975  1.975  9.334 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.704  1.705  1.482 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.307  1.307  4.242 × 10^{1}
100. MeV 1.764 × 10^{2} 1.237  1.237  5.818 × 10^{1}
140. MeV 2.218 × 10^{2} 1.169  1.169  9.160 × 10^{1}
200. MeV 2.868 × 10^{2} 1.137  1.137  1.438 × 10^{2}
239. MeV 3.285 × 10^{2} 1.134  0.000  1.134 Minimum ionization
300. MeV 3.917 × 10^{2} 1.138  0.000  0.000  1.139  2.319 × 10^{2}
400. MeV 4.945 × 10^{2} 1.157  0.000  0.000  1.157  3.190 × 10^{2}
800. MeV 8.995 × 10^{2} 1.236  0.001  0.000  1.237  6.528 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.267  0.001  0.000  1.269  8.123 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.318  0.002  0.001  1.321  1.121 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.372  0.004  0.001  0.001  1.378  1.565 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.433  0.007  0.003  0.001  1.445  2.273 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.475  0.010  0.006  0.002  1.494  2.953 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.572  0.024  0.021  0.003  1.621  5.514 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.601  0.032  0.030  0.004  1.667  6.730 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.642  0.049  0.050  0.005  1.746  9.073 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.684  0.076  0.081  0.007  1.849  1.241 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.728  0.124  0.143  0.011  2.006  1.760 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.757  0.175  0.211  0.014  2.158  2.240 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.822  0.395  0.509  0.028  2.756  3.876 × 10^{4}
100. GeV 1.001 × 10^{5} 1.842  0.512  0.670  0.035  3.060  4.565 × 10^{4}
140. GeV 1.401 × 10^{5} 1.871  0.752  1.001  0.048  3.674  5.757 × 10^{4}
145. GeV 1.450 × 10^{5} 1.874  0.782  1.043  0.050  3.749 Muon critical energy
200. GeV 2.001 × 10^{5} 1.901  1.127  1.526  0.069  4.624  7.210 × 10^{4}
300. GeV 3.001 × 10^{5} 1.934  1.766  2.402  0.103  6.207  9.072 × 10^{4}
400. GeV 4.001 × 10^{5} 1.958  2.427  3.310  0.137  7.834  1.050 × 10^{5}
800. GeV 8.001 × 10^{5} 2.015  5.154  7.032  0.278  14.480  1.420 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.034  6.554  8.935  0.349  17.873  1.544 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.062  9.358  12.731  0.494  24.647  1.734 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.093  13.645  18.523  0.714  34.977  1.938 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.128  20.800  28.146  1.092  52.167  2.170 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.153  28.046  37.871  1.475  69.547  2.336 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.215  57.250  76.956  3.062 139.485  2.734 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.236  71.960  96.601  3.877 174.675  2.862 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.267 101.301 135.799  5.549 244.917  3.054 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.300 145.558 194.844  8.110 350.814  3.258 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.339 219.236 293.077  12.531 527.185  3.489 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.367 293.165 391.537  17.055 704.125  3.652 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.436 589.275 785.647  35.934 1413.294  4.045 × 10^{5}
100. TeV 1.000 × 10^{8} 2.459 737.560 982.880  45.680 1768.581  4.172 × 10^{5}