Muons in iodine (I)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
53 (I) 126.90447(3) 4.930  491.0 0.23766 2.7276 0.0549 3.2596 5.9488  0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.499  4.499  1.267 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.561  3.561  2.276 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.818  2.818  4.191 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.214  2.215  8.247 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.907  1.907  1.314 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.459  1.459  3.785 × 10^{1}
100. MeV 1.764 × 10^{2} 1.380  1.380  5.197 × 10^{1}
140. MeV 2.218 × 10^{2} 1.304  1.304  8.192 × 10^{1}
200. MeV 2.868 × 10^{2} 1.267  1.268  1.288 × 10^{2}
242. MeV 3.316 × 10^{2} 1.263  1.263 Minimum ionization
300. MeV 3.917 × 10^{2} 1.268  0.000  0.000  1.268  2.078 × 10^{2}
400. MeV 4.945 × 10^{2} 1.287  0.000  0.000  1.287  2.861 × 10^{2}
800. MeV 8.995 × 10^{2} 1.372  0.001  0.000  1.374  5.866 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.407  0.001  0.000  1.408  7.303 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.461  0.002  0.000  0.001  1.463  1.009 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.519  0.003  0.001  0.001  1.524  1.410 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.585  0.005  0.003  0.001  1.595  2.050 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.631  0.007  0.005  0.002  1.645  2.667 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.734  0.018  0.017  0.003  1.772  5.000 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.764  0.024  0.024  0.004  1.817  6.114 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.808  0.036  0.039  0.005  1.890  8.272 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.852  0.056  0.064  0.008  1.980  1.137 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.898  0.092  0.112  0.011  2.113  1.626 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.928  0.130  0.164  0.015  2.237  2.085 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.996  0.293  0.393  0.029  2.711  3.706 × 10^{4}
100. GeV 1.001 × 10^{5} 2.016  0.379  0.516  0.036  2.948  4.414 × 10^{4}
140. GeV 1.401 × 10^{5} 2.046  0.557  0.770  0.050  3.424  5.672 × 10^{4}
200. GeV 2.000 × 10^{5} 2.076  0.834  1.171  0.071  4.154 Muon critical energy
200. GeV 2.001 × 10^{5} 2.076  0.835  1.172  0.071  4.155  7.261 × 10^{4}
300. GeV 3.001 × 10^{5} 2.111  1.309  1.845  0.107  5.373  9.373 × 10^{4}
400. GeV 4.001 × 10^{5} 2.136  1.799  2.541  0.142  6.620  1.105 × 10^{5}
800. GeV 8.001 × 10^{5} 2.195  3.824  5.398  0.288  11.707  1.553 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.215  4.865  6.860  0.362  14.302  1.708 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.244  6.950  9.775  0.512  19.483  1.946 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.276  10.140  14.224  0.741  27.382  2.205 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.313  15.466  21.617  1.133  40.530  2.503 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.339  20.863  29.089  1.531  53.823  2.717 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.404  42.622  59.124  3.181 107.332  3.233 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.425  53.587  74.222  4.028 134.264  3.399 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.458  75.458 104.347  5.767 188.031  3.650 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.493 108.458 149.728  8.432 269.112  3.915 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.533 163.396 225.232  13.036 404.198  4.216 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.562 218.532 300.914  17.748 539.758  4.430 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.634 439.406 603.853  37.415 1083.309  4.942 × 10^{5}
100. TeV 1.000 × 10^{8} 2.658 550.030 755.460  47.570 1355.719  5.107 × 10^{5}