Muons in indium (In)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
49 (In) 114.818(3)  7.310  488.0 0.23879 2.7144 0.2406 3.2032 5.5211  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.596  4.596  1.241 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.637  3.637  2.228 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.877  2.877  4.103 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.260  2.260  8.077 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.944  1.944  1.288 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.482  1.482  3.716 × 10^{1}
100. MeV 1.764 × 10^{2} 1.399  1.400  5.108 × 10^{1}
140. MeV 2.218 × 10^{2} 1.320  1.321  8.064 × 10^{1}
200. MeV 2.868 × 10^{2} 1.283  1.283  1.269 × 10^{2}
246. MeV 3.356 × 10^{2} 1.278  1.278 Minimum ionization
300. MeV 3.917 × 10^{2} 1.282  0.000  0.000  1.282  2.051 × 10^{2}
400. MeV 4.945 × 10^{2} 1.301  0.000  0.000  1.301  2.825 × 10^{2}
800. MeV 8.995 × 10^{2} 1.386  0.001  0.000  1.387  5.799 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.420  0.001  0.000  1.422  7.223 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.474  0.002  0.000  0.001  1.477  9.980 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.533  0.003  0.001  0.001  1.538  1.396 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.599  0.005  0.003  0.001  1.608  2.031 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.645  0.007  0.005  0.002  1.659  2.642 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.748  0.017  0.017  0.003  1.785  4.957 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.779  0.023  0.023  0.004  1.829  6.063 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.823  0.034  0.038  0.005  1.901  8.207 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.867  0.053  0.061  0.008  1.990  1.129 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.914  0.087  0.107  0.011  2.120  1.615 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.944  0.123  0.156  0.015  2.240  2.074 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.012  0.279  0.375  0.029  2.696  3.698 × 10^{4}
100. GeV 1.001 × 10^{5} 2.033  0.361  0.493  0.036  2.924  4.411 × 10^{4}
140. GeV 1.401 × 10^{5} 2.063  0.530  0.736  0.051  3.380  5.682 × 10^{4}
200. GeV 2.001 × 10^{5} 2.094  0.794  1.120  0.072  4.082  7.296 × 10^{4}
210. GeV 2.102 × 10^{5} 2.099  0.839  1.184  0.075  4.199 Muon critical energy
300. GeV 3.001 × 10^{5} 2.130  1.246  1.763  0.108  5.248  9.452 × 10^{4}
400. GeV 4.001 × 10^{5} 2.155  1.713  2.429  0.144  6.441  1.117 × 10^{5}
800. GeV 8.001 × 10^{5} 2.216  3.641  5.160  0.290  11.309  1.580 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.236  4.632  6.557  0.365  13.791  1.740 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.266  6.618  9.345  0.517  18.747  1.988 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.299  9.657  13.599  0.747  26.303  2.257 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.336  14.730  20.669  1.143  38.879  2.568 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.363  19.872  27.814  1.544  51.595  2.790 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.429  40.605  56.539  3.209 102.783  3.329 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.451  51.054  70.978  4.064 128.548  3.502 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.484  71.896  99.789  5.819 179.988  3.764 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.520 103.344 143.190  8.508 257.563  4.041 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.561 155.700 215.402  13.155 386.820  4.356 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.591 208.246 287.787  17.912 516.537  4.579 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.665 418.754 577.532  37.772 1036.725  5.115 × 10^{5}
100. TeV 1.000 × 10^{8} 2.689 524.190 722.540  48.030 1297.450  5.287 × 10^{5}