Muons in hydrogen gas (H_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
1 (H)  1.008(7) 8.376 × 10^{−5} 19.2 0.14092 5.7273 1.8639 3.2718 9.5834  0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 16.742  16.743  3.267 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 12.988  12.988  6.009 × 10^{−1}
20.0 MeV 6.802 × 10^{1} 10.089  10.089  1.131 × 10^{0}
30.0 MeV 8.509 × 10^{1} 7.783  7.783  2.276 × 10^{0}
40.0 MeV 1.003 × 10^{2} 6.621  6.621  3.678 × 10^{0}
80.0 MeV 1.527 × 10^{2} 4.927  4.927  1.091 × 10^{1}
100. MeV 1.764 × 10^{2} 4.621  4.621  1.511 × 10^{1}
140. MeV 2.218 × 10^{2} 4.314  4.314  2.411 × 10^{1}
200. MeV 2.868 × 10^{2} 4.148  0.000  4.148  3.835 × 10^{1}
282. MeV 3.733 × 10^{2} 4.103  0.000  4.103 Minimum ionization
300. MeV 3.917 × 10^{2} 4.104  0.000  4.105  6.266 × 10^{1}
400. MeV 4.945 × 10^{2} 4.141  0.000  4.141  8.693 × 10^{1}
800. MeV 8.995 × 10^{2} 4.373  0.000  4.373  1.809 × 10^{2}
1.00 GeV 1.101 × 10^{3} 4.474  0.001  4.475  2.261 × 10^{2}
1.40 GeV 1.502 × 10^{3} 4.642  0.000  0.001  4.643  3.138 × 10^{2}
2.00 GeV 2.103 × 10^{3} 4.832  0.000  0.001  4.833  4.403 × 10^{2}
3.00 GeV 3.104 × 10^{3} 5.056  0.000  0.000  0.002  5.059  6.422 × 10^{2}
4.00 GeV 4.104 × 10^{3} 5.218  0.001  0.000  0.002  5.221  8.367 × 10^{2}
8.00 GeV 8.105 × 10^{3} 5.606  0.001  0.001  0.005  5.614  1.572 × 10^{3}
10.0 GeV 1.011 × 10^{4} 5.711  0.002  0.002  0.006  5.720  1.925 × 10^{3}
14.0 GeV 1.411 × 10^{4} 5.841  0.003  0.003  0.008  5.855  2.615 × 10^{3}
20.0 GeV 2.011 × 10^{4} 5.955  0.005  0.006  0.011  5.976  3.629 × 10^{3}
30.0 GeV 3.011 × 10^{4} 6.063  0.008  0.010  0.015  6.097  5.284 × 10^{3}
40.0 GeV 4.011 × 10^{4} 6.132  0.012  0.015  0.020  6.179  6.913 × 10^{3}
80.0 GeV 8.011 × 10^{4} 6.285  0.028  0.038  0.038  6.389  1.327 × 10^{4}
100. GeV 1.001 × 10^{5} 6.331  0.037  0.050  0.047  6.466  1.638 × 10^{4}
140. GeV 1.401 × 10^{5} 6.401  0.055  0.076  0.066  6.598  2.250 × 10^{4}
200. GeV 2.001 × 10^{5} 6.473  0.085  0.118  0.093  6.770  3.148 × 10^{4}
300. GeV 3.001 × 10^{5} 6.556  0.137  0.191  0.139  7.023  4.597 × 10^{4}
400. GeV 4.001 × 10^{5} 6.614  0.191  0.268  0.185  7.258  5.998 × 10^{4}
800. GeV 8.001 × 10^{5} 6.756  0.423  0.592  0.373  8.144  1.119 × 10^{5}
1.00 TeV 1.000 × 10^{6} 6.802  0.544  0.761  0.468  8.576  1.359 × 10^{5}
1.40 TeV 1.400 × 10^{6} 6.873  0.791  1.101  0.663  9.429  1.803 × 10^{5}
2.00 TeV 2.000 × 10^{6} 6.948  1.175  1.627  0.961  10.711  2.400 × 10^{5}
3.00 TeV 3.000 × 10^{6} 7.035  1.827  2.504  1.474  12.840  3.252 × 10^{5}
3.61 TeV 3.611 × 10^{6} 7.075  2.234  3.049  1.792  14.151 Muon critical energy
4.00 TeV 4.000 × 10^{6} 7.098  2.496  3.399  1.996  14.989  3.972 × 10^{5}
8.00 TeV 8.000 × 10^{6} 7.252  5.240  7.012  4.180  23.684  6.078 × 10^{5}
10.0 TeV 1.000 × 10^{7} 7.302  6.642  8.837  5.308  28.089  6.852 × 10^{5}
14.0 TeV 1.400 × 10^{7} 7.379  9.452  12.466  7.642  36.939  8.090 × 10^{5}
20.0 TeV 2.000 × 10^{7} 7.463  13.734  17.952  11.236  50.385  9.476 × 10^{5}
30.0 TeV 3.000 × 10^{7} 7.559  20.884  27.062  17.498  73.003  1.112 × 10^{6}
40.0 TeV 4.000 × 10^{7} 7.628  28.113  36.210  23.940  95.890  1.231 × 10^{6}
80.0 TeV 8.000 × 10^{7} 7.799  57.248  72.833  51.135 189.015  1.523 × 10^{6}
100. TeV 1.000 × 10^{8} 7.855  71.920  91.170  65.290 236.236  1.617 × 10^{6}