Muons in holmium (Ho)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
67 (Ho) 164.93033(2) 8.795  650.0 0.24638 2.5726 0.0761 3.4782 5.9587  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.132  4.132  1.393 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.283  3.283  2.489 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.605  2.605  4.562 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.051  2.051  8.945 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.767  1.767  1.423 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.350  1.350  4.091 × 10^{1}
100. MeV 1.764 × 10^{2} 1.277  1.277  5.618 × 10^{1}
140. MeV 2.218 × 10^{2} 1.207  1.207  8.854 × 10^{1}
200. MeV 2.868 × 10^{2} 1.174  1.174  1.391 × 10^{2}
237. MeV 3.260 × 10^{2} 1.170  0.000  1.170 Minimum ionization
300. MeV 3.917 × 10^{2} 1.175  0.000  0.000  1.176  2.244 × 10^{2}
400. MeV 4.945 × 10^{2} 1.195  0.000  0.000  1.195  3.089 × 10^{2}
800. MeV 8.995 × 10^{2} 1.278  0.001  0.000  1.279  6.319 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.311  0.001  0.000  1.313  7.861 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.365  0.002  0.000  0.001  1.367  1.084 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.422  0.003  0.001  0.001  1.428  1.513 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.488  0.006  0.003  0.001  1.498  2.196 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.533  0.009  0.006  0.002  1.550  2.851 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.636  0.021  0.020  0.003  1.681  5.319 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.667  0.028  0.028  0.004  1.728  6.492 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.712  0.043  0.046  0.005  1.807  8.754 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.757  0.067  0.075  0.007  1.907  1.198 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.804  0.110  0.131  0.011  2.057  1.703 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.835  0.156  0.192  0.014  2.199  2.173 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.904  0.353  0.463  0.028  2.749  3.796 × 10^{4}
100. GeV 1.001 × 10^{5} 1.924  0.457  0.609  0.035  3.027  4.489 × 10^{4}
140. GeV 1.401 × 10^{5} 1.954  0.671  0.909  0.049  3.585  5.703 × 10^{4}
165. GeV 1.649 × 10^{5} 1.968  0.808  1.103  0.058  3.938 Muon critical energy
200. GeV 2.001 × 10^{5} 1.985  1.006  1.385  0.070  4.447  7.203 × 10^{4}
300. GeV 3.001 × 10^{5} 2.019  1.577  2.180  0.104  5.882  9.154 × 10^{4}
400. GeV 4.001 × 10^{5} 2.043  2.167  3.003  0.139  7.354  1.067 × 10^{5}
800. GeV 8.001 × 10^{5} 2.101  4.604  6.379  0.281  13.366  1.465 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.120  5.855  8.105  0.354  16.435  1.600 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.149  8.362  11.548  0.501  22.561  1.807 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.180  12.195  16.802  0.724  31.903  2.029 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.215  18.593  25.532  1.107  47.449  2.285 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.241  25.075  34.354  1.496  63.166  2.467 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.304  51.200  69.812  3.106 126.424  2.906 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.324  64.362  87.634  3.933 158.255  3.047 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.356  90.614 123.196  5.629 221.797  3.259 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.390 130.218 176.764  8.228 317.602  3.484 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.430 196.147 265.887  12.716 477.182  3.739 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.458 262.306 355.216  17.309 637.291  3.920 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.528 527.313 712.789  36.475 1279.107  4.354 × 10^{5}
100. TeV 1.000 × 10^{8} 2.551 660.030 891.740  46.370 1600.693  4.494 × 10^{5}