Muons in helium gas (He)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
2 (He) 4.002602(2) 1.663 × 10^{−4} 41.8 0.13443 5.8347 2.2017 3.6122 11.1393 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.709  7.709  7.138 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.998  5.998  1.308 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.673  4.673  2.455 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.616  3.616  4.922 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.082  3.083  7.937 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.305  2.305  2.343 × 10^{1}
100. MeV 1.764 × 10^{2} 2.165  2.165  3.240 × 10^{1}
140. MeV 2.218 × 10^{2} 2.026  2.026  5.159 × 10^{1}
200. MeV 2.868 × 10^{2} 1.954  0.000  1.954  8.186 × 10^{1}
267. MeV 3.577 × 10^{2} 1.937  0.000  1.937 Minimum ionization
300. MeV 3.917 × 10^{2} 1.939  0.000  1.939  1.334 × 10^{2}
400. MeV 4.945 × 10^{2} 1.961  0.000  1.961  1.847 × 10^{2}
800. MeV 8.995 × 10^{2} 2.081  0.000  2.082  3.826 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.133  0.001  2.134  4.774 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.218  0.000  0.001  2.219  6.611 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.314  0.000  0.001  2.315  9.255 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.427  0.000  0.000  0.002  2.429  1.347 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.508  0.000  0.000  0.002  2.511  1.751 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.705  0.001  0.001  0.004  2.712  3.277 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.768  0.002  0.002  0.005  2.776  4.005 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.862  0.002  0.003  0.007  2.874  5.420 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.954  0.004  0.004  0.010  2.972  7.470 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.033  0.006  0.008  0.014  3.062  1.078 × 10^{4}
40.0 GeV 4.011 × 10^{4} 3.077  0.009  0.012  0.019  3.117  1.401 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.163  0.021  0.029  0.036  3.250  2.656 × 10^{4}
100. GeV 1.001 × 10^{5} 3.188  0.028  0.039  0.045  3.299  3.266 × 10^{4}
140. GeV 1.401 × 10^{5} 3.223  0.042  0.058  0.062  3.386  4.463 × 10^{4}
200. GeV 2.001 × 10^{5} 3.260  0.063  0.090  0.088  3.501  6.205 × 10^{4}
300. GeV 3.001 × 10^{5} 3.302  0.101  0.144  0.132  3.679  8.990 × 10^{4}
400. GeV 4.001 × 10^{5} 3.331  0.140  0.201  0.175  3.848  1.165 × 10^{5}
800. GeV 8.001 × 10^{5} 3.403  0.306  0.443  0.354  4.506  2.124 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.426  0.392  0.569  0.445  4.832  2.553 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.461  0.566  0.821  0.632  5.481  3.329 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.499  0.836  1.210  0.916  6.461  4.337 × 10^{5}
2.35 TeV 2.352 × 10^{6} 3.517  0.993  1.437  1.086  7.034 Muon critical energy
3.00 TeV 3.000 × 10^{6} 3.543  1.289  1.861  1.404  8.097  5.717 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.575  1.751  2.524  1.902  9.753  6.841 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.652  3.634  5.207  3.979  16.472  9.963 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.678  4.589  6.563  5.050  19.880  1.107 × 10^{6}
14.0 TeV 1.400 × 10^{7} 3.717  6.497  9.260  7.260  26.734  1.280 × 10^{6}
20.0 TeV 2.000 × 10^{7} 3.758  9.390  13.338  10.660  37.147  1.469 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.807  14.206  20.112  16.578  54.703  1.690 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.842  19.055  26.915  22.660  72.473  1.848 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.928  38.527  54.158  48.256 144.869  2.231 × 10^{6}
100. TeV 1.000 × 10^{8} 3.956  48.300  67.800  61.550 181.606  2.354 × 10^{6}