Muons in hafnium (Hf)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
72 (Hf) 178.49(2)  13.310  705.0 0.22918 2.6155 0.1965 3.4337 5.7139  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.035  4.035  1.432 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.212  3.212  2.553 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.553  2.553  4.670 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.014  2.014  9.137 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.737  1.737  1.452 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.330  1.331  4.161 × 10^{1}
100. MeV 1.764 × 10^{2} 1.258  1.258  5.711 × 10^{1}
140. MeV 2.218 × 10^{2} 1.188  1.188  8.997 × 10^{1}
200. MeV 2.868 × 10^{2} 1.155  1.156  1.413 × 10^{2}
243. MeV 3.325 × 10^{2} 1.152  0.000  1.152 Minimum ionization
300. MeV 3.917 × 10^{2} 1.156  0.000  0.000  1.157  2.280 × 10^{2}
400. MeV 4.945 × 10^{2} 1.175  0.000  0.000  1.176  3.138 × 10^{2}
800. MeV 8.995 × 10^{2} 1.256  0.001  0.000  1.258  6.423 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.289  0.001  0.000  1.291  7.992 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.341  0.002  0.001  1.344  1.103 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.397  0.004  0.001  0.001  1.403  1.539 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.461  0.006  0.003  0.001  1.472  2.234 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.505  0.009  0.006  0.002  1.522  2.901 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.606  0.023  0.021  0.003  1.653  5.413 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.636  0.030  0.029  0.004  1.700  6.606 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.679  0.046  0.048  0.005  1.779  8.904 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.723  0.072  0.078  0.007  1.881  1.218 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.769  0.117  0.137  0.011  2.035  1.729 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.799  0.166  0.202  0.014  2.182  2.204 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.866  0.374  0.487  0.028  2.756  3.831 × 10^{4}
100. GeV 1.001 × 10^{5} 1.886  0.485  0.640  0.035  3.048  4.521 × 10^{4}
140. GeV 1.401 × 10^{5} 1.916  0.712  0.956  0.049  3.634  5.721 × 10^{4}
154. GeV 1.546 × 10^{5} 1.924  0.796  1.075  0.054  3.850 Muon critical energy
200. GeV 2.001 × 10^{5} 1.946  1.067  1.457  0.069  4.540  7.196 × 10^{4}
300. GeV 3.001 × 10^{5} 1.980  1.672  2.294  0.104  6.051  9.099 × 10^{4}
400. GeV 4.001 × 10^{5} 2.003  2.298  3.160  0.138  7.602  1.057 × 10^{5}
800. GeV 8.001 × 10^{5} 2.061  4.881  6.713  0.279  13.936  1.440 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.080  6.207  8.529  0.351  17.169  1.569 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.108  8.864  12.153  0.497  23.624  1.767 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.139  12.927  17.681  0.719  33.468  1.980 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.174  19.707  26.868  1.099  49.850  2.223 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.200  26.574  36.150  1.485  66.411  2.396 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.262  54.253  73.461  3.084 133.062  2.813 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.283  68.197  92.214  3.904 166.600  2.947 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.314  96.008 129.633  5.587 233.544  3.149 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.348 137.960 185.998  8.166 334.474  3.363 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.387 207.800 279.776  12.621 502.586  3.605 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.415 277.881 373.772  17.179 671.249  3.776 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.485 558.592 750.012  36.195 1347.285  4.189 × 10^{5}
100. TeV 1.000 × 10^{8} 2.508 699.170 938.300  46.010 1685.990  4.321 × 10^{5}