Muons in gypsum (plaster of Paris, CaSO_{4}·H_{2}O)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51113 & 2.320 & 129.7 & 0.06949 & 3.5134 & 0.0995 & 3.1206 & 3.8382 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.814  6.814  8.155 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.331  5.331  1.486 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.174  4.174  2.772 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.248  3.248  5.526 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.778  2.778  8.877 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.090  2.090  2.599 × 10^{1}
100. MeV 1.764 × 10^{2} 1.962  1.962  3.589 × 10^{1}
140. MeV 2.218 × 10^{2} 1.833  1.833  5.709 × 10^{1}
200. MeV 2.868 × 10^{2} 1.761  1.761  9.061 × 10^{1}
297. MeV 3.884 × 10^{2} 1.738  0.000  1.738 Minimum ionization
300. MeV 3.917 × 10^{2} 1.738  0.000  1.739  1.479 × 10^{2}
400. MeV 4.945 × 10^{2} 1.749  0.000  1.749  2.053 × 10^{2}
800. MeV 8.995 × 10^{2} 1.826  0.000  0.000  1.827  4.291 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.860  0.000  0.000  1.861  5.375 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.915  0.001  0.000  0.001  1.917  7.491 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.975  0.001  0.000  0.001  1.978  1.057 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.043  0.002  0.001  0.001  2.047  1.553 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.090  0.002  0.002  0.002  2.096  2.036 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.198  0.006  0.005  0.004  2.213  3.887 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.230  0.007  0.008  0.005  2.250  4.783 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.277  0.011  0.012  0.006  2.308  6.537 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.325  0.018  0.020  0.009  2.372  9.100 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.375  0.029  0.035  0.013  2.453  1.324 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.409  0.041  0.052  0.017  2.519  1.726 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.487  0.092  0.125  0.033  2.738  3.247 × 10^{4}
100. GeV 1.001 × 10^{5} 2.511  0.120  0.165  0.041  2.837  3.964 × 10^{4}
140. GeV 1.401 × 10^{5} 2.547  0.176  0.246  0.057  3.027  5.329 × 10^{4}
200. GeV 2.001 × 10^{5} 2.584  0.265  0.376  0.081  3.306  7.225 × 10^{4}
300. GeV 3.001 × 10^{5} 2.627  0.416  0.595  0.121  3.760  1.006 × 10^{5}
400. GeV 4.001 × 10^{5} 2.657  0.574  0.824  0.162  4.216  1.257 × 10^{5}
663. GeV 6.634 × 10^{5} 2.710  1.000  1.440  0.270  5.421 Muon critical energy
800. GeV 8.001 × 10^{5} 2.730  1.226  1.766  0.327  6.050  2.045 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.754  1.562  2.251  0.411  6.978  2.352 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.790  2.239  3.217  0.582  8.829  2.861 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.829  3.276  4.696  0.843  11.644  3.451 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.874  5.011  7.155  1.291  16.331  4.173 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.906  6.774  9.645  1.746  21.071  4.711 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.985  13.899  19.666  3.641  40.192  6.062 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.011  17.498  24.710  4.616  49.835  6.508 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.051  24.680  34.765  6.624  69.120  7.187 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.094  35.535  49.923  9.706  98.258  7.911 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.143  53.593  75.147  15.050 146.934  8.738 × 10^{5}
40.0 TeV 4.000 × 10^{7} 3.179  71.733 100.445  20.530 195.888  9.326 × 10^{5}
80.0 TeV 8.000 × 10^{7} 3.267 144.466 201.717  43.500 392.950  1.074 × 10^{6}
100. TeV 1.000 × 10^{8} 3.296 180.922 252.408  55.395 492.022  1.119 × 10^{6}