Muons in guanine (C_{5}H_{5}N_{5}O)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.51612 & 1.580 & 75.0 & 0.20530 & 3.0186 & 0.1163 & 2.4296 & 3.1171 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.406  7.406  7.463 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.777  5.777  1.364 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.511  4.512  2.553 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.500  3.500  5.105 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.989  2.989  8.217 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.237  2.237  2.416 × 10^{1}
100. MeV 1.764 × 10^{2} 2.095  2.095  3.343 × 10^{1}
140. MeV 2.218 × 10^{2} 1.949  1.949  5.332 × 10^{1}
200. MeV 2.868 × 10^{2} 1.865  1.865  8.492 × 10^{1}
300. MeV 3.917 × 10^{2} 1.832  0.000  1.832  1.392 × 10^{2}
318. MeV 4.105 × 10^{2} 1.832  0.000  1.832 Minimum ionization
400. MeV 4.945 × 10^{2} 1.837  0.000  1.838  1.937 × 10^{2}
800. MeV 8.995 × 10^{2} 1.906  0.000  0.000  1.907  4.075 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.938  0.000  0.000  1.938  5.115 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.989  0.000  0.001  1.990  7.150 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.046  0.001  0.000  0.001  2.048  1.012 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.111  0.001  0.001  0.001  2.114  1.492 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.155  0.001  0.001  0.002  2.160  1.960 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.258  0.003  0.003  0.004  2.268  3.761 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.289  0.004  0.004  0.005  2.303  4.636 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.334  0.007  0.007  0.007  2.355  6.353 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.380  0.010  0.012  0.009  2.411  8.869 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.429  0.017  0.021  0.013  2.480  1.296 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.463  0.024  0.030  0.018  2.535  1.694 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.541  0.054  0.073  0.034  2.703  3.220 × 10^{4}
100. GeV 1.001 × 10^{5} 2.565  0.071  0.096  0.042  2.775  3.950 × 10^{4}
140. GeV 1.401 × 10^{5} 2.601  0.104  0.145  0.059  2.910  5.357 × 10^{4}
200. GeV 2.001 × 10^{5} 2.639  0.157  0.222  0.084  3.102  7.354 × 10^{4}
300. GeV 3.001 × 10^{5} 2.682  0.248  0.353  0.125  3.408  1.043 × 10^{5}
400. GeV 4.001 × 10^{5} 2.713  0.342  0.489  0.167  3.710  1.324 × 10^{5}
800. GeV 8.001 × 10^{5} 2.786  0.734  1.057  0.337  4.914  2.258 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.810  0.937  1.351  0.423  5.521  2.641 × 10^{5}
1.04 TeV 1.036 × 10^{6} 2.814  0.973  1.402  0.439  5.629 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.847  1.345  1.935  0.601  6.727  3.297 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.886  1.972  2.830  0.870  8.558  4.086 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.931  3.023  4.321  1.333  11.609  5.086 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.964  4.093  5.833  1.803  14.694  5.850 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.044  8.423  11.924  3.764  27.156  7.822 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.070  10.613  14.993  4.775  33.451  8.484 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.111  14.983  21.105  6.856  46.055  9.499 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.154  21.593  30.326  10.053  65.126  1.059 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.204  32.600  45.667  15.603  97.074  1.184 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.240  43.665  61.058  21.300 129.263  1.273 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.329  88.030 122.676  45.207 259.242  1.487 × 10^{6}
100. TeV 1.000 × 10^{8} 3.358 110.270 153.522  57.600 324.750  1.556 × 10^{6}