Muons in glutamine (C_{5}H_{10}N_{2}O_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53371 & 1.460 & 73.3 & 0.11931 & 3.3254 & 0.1347 & 2.6301 & 3.1167 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.681  7.681  7.194 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.991  5.991  1.315 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.678  4.678  2.462 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.629  3.629  4.923 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.098  3.098  7.925 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.322  2.322  2.330 × 10^{1}
100. MeV 1.764 × 10^{2} 2.174  2.174  3.223 × 10^{1}
140. MeV 2.218 × 10^{2} 2.022  2.022  5.140 × 10^{1}
200. MeV 2.868 × 10^{2} 1.934  1.935  8.186 × 10^{1}
300. MeV 3.917 × 10^{2} 1.900  0.000  1.900  1.342 × 10^{2}
325. MeV 4.171 × 10^{2} 1.899  0.000  1.899 Minimum ionization
400. MeV 4.945 × 10^{2} 1.905  0.000  1.905  1.868 × 10^{2}
800. MeV 8.995 × 10^{2} 1.975  0.000  0.000  1.976  3.931 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.007  0.000  0.000  2.008  4.934 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.060  0.000  0.001  2.061  6.899 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.118  0.001  0.000  0.001  2.120  9.767 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.185  0.001  0.001  0.001  2.188  1.440 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.231  0.001  0.001  0.002  2.236  1.892 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.338  0.003  0.003  0.004  2.348  3.633 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.370  0.004  0.004  0.005  2.384  4.478 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.417  0.007  0.007  0.007  2.438  6.136 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.464  0.010  0.012  0.009  2.496  8.567 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.516  0.017  0.021  0.014  2.567  1.251 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.551  0.024  0.030  0.018  2.623  1.637 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.631  0.055  0.074  0.034  2.794  3.112 × 10^{4}
100. GeV 1.001 × 10^{5} 2.656  0.071  0.097  0.042  2.867  3.818 × 10^{4}
140. GeV 1.401 × 10^{5} 2.694  0.105  0.146  0.059  3.004  5.180 × 10^{4}
200. GeV 2.001 × 10^{5} 2.733  0.158  0.224  0.084  3.199  7.115 × 10^{4}
300. GeV 3.001 × 10^{5} 2.777  0.250  0.355  0.125  3.508  1.010 × 10^{5}
400. GeV 4.001 × 10^{5} 2.809  0.345  0.493  0.167  3.814  1.283 × 10^{5}
800. GeV 8.001 × 10^{5} 2.885  0.740  1.066  0.338  5.029  2.194 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.910  0.945  1.362  0.424  5.641  2.569 × 10^{5}
1.06 TeV 1.064 × 10^{6} 2.917  1.010  1.455  0.453  5.834 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.948  1.357  1.951  0.602  6.858  3.211 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.988  1.990  2.854  0.872  8.705  3.986 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.035  3.052  4.358  1.336  11.781  4.970 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.069  4.132  5.883  1.808  14.892  5.723 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.152  8.506  12.027  3.774  27.460  7.672 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.179  10.719  15.122  4.787  33.807  8.327 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.220  15.135  21.288  6.874  46.517  9.332 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.265  21.815  30.588  10.081  65.749  1.041 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.317  32.938  46.062  15.648  97.965  1.165 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.354  44.122  61.587  21.362 130.425  1.253 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.446  88.965 123.739  45.346 261.496  1.466 × 10^{6}
100. TeV 1.000 × 10^{8} 3.476 111.447 154.852  57.780 327.555  1.534 × 10^{6}