Muons in glucose (dextrose monohydrate) (C_{6}H_{12}O_{6}.H_{2}O))

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53499 & 1.540 & 77.2 & 0.10783 & 3.3946 & 0.1411 & 2.6700 & 3.1649 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.648  7.648  7.228 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.966  5.966  1.321 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.660  4.660  2.472 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.616  3.616  4.942 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.088  3.088  7.955 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.316  2.316  2.338 × 10^{1}
100. MeV 1.764 × 10^{2} 2.169  2.169  3.233 × 10^{1}
140. MeV 2.218 × 10^{2} 2.018  2.019  5.154 × 10^{1}
200. MeV 2.868 × 10^{2} 1.932  1.932  8.204 × 10^{1}
300. MeV 3.917 × 10^{2} 1.898  0.000  1.898  1.344 × 10^{2}
318. MeV 4.105 × 10^{2} 1.897  0.000  1.898 Minimum ionization
400. MeV 4.945 × 10^{2} 1.903  0.000  1.904  1.871 × 10^{2}
800. MeV 8.995 × 10^{2} 1.974  0.000  0.000  1.975  3.935 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.007  0.000  0.000  2.008  4.939 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.060  0.000  0.001  2.061  6.904 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.119  0.001  0.000  0.001  2.120  9.772 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.185  0.001  0.001  0.001  2.188  1.441 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.232  0.001  0.001  0.002  2.236  1.893 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.339  0.003  0.003  0.004  2.349  3.632 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.371  0.005  0.004  0.005  2.385  4.477 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.418  0.007  0.007  0.007  2.439  6.135 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.466  0.011  0.012  0.009  2.498  8.564 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.517  0.018  0.021  0.013  2.570  1.251 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.552  0.025  0.031  0.018  2.627  1.635 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.633  0.057  0.076  0.034  2.801  3.108 × 10^{4}
100. GeV 1.001 × 10^{5} 2.658  0.074  0.101  0.042  2.875  3.812 × 10^{4}
140. GeV 1.401 × 10^{5} 2.696  0.109  0.151  0.059  3.015  5.171 × 10^{4}
200. GeV 2.001 × 10^{5} 2.735  0.164  0.231  0.084  3.214  7.098 × 10^{4}
300. GeV 3.001 × 10^{5} 2.779  0.258  0.368  0.125  3.531  1.006 × 10^{5}
400. GeV 4.001 × 10^{5} 2.811  0.356  0.510  0.167  3.844  1.278 × 10^{5}
800. GeV 8.001 × 10^{5} 2.887  0.765  1.102  0.337  5.092  2.179 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.912  0.977  1.408  0.424  5.721  2.549 × 10^{5}
1.04 TeV 1.036 × 10^{6} 2.916  1.015  1.462  0.440  5.833 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.950  1.402  2.016  0.601  6.970  3.182 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.991  2.057  2.949  0.870  8.867  3.943 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.038  3.153  4.503  1.333  12.027  4.908 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.072  4.269  6.078  1.805  15.223  5.646 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.155  8.786  12.422  3.767  28.130  7.549 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.182  11.071  15.618  4.778  34.649  8.189 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.223  15.631  21.984  6.860  47.699  9.169 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.268  22.528  31.588  10.060  67.445  1.022 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.320  34.014  47.567  15.615 100.516  1.143 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.358  45.560  63.597  21.316 133.831  1.229 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.450  91.862 127.774  45.242 268.328  1.436 × 10^{6}
100. TeV 1.000 × 10^{8} 3.480 115.075 159.900  57.645 336.100  1.502 × 10^{6}