Muons in germanium (Ge)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
32 (Ge) 72.630(1)  5.323  350.0 0.07188 3.3306 0.3376 3.6096 5.1411  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.033  5.033  1.124 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.968  3.968  2.028 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.129  3.129  3.749 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.451  2.451  7.408 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.105  2.105  1.184 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.600  1.600  3.430 × 10^{1}
100. MeV 1.764 × 10^{2} 1.510  1.510  4.720 × 10^{1}
140. MeV 2.218 × 10^{2} 1.423  1.423  7.461 × 10^{1}
200. MeV 2.868 × 10^{2} 1.378  1.378  1.176 × 10^{2}
257. MeV 3.471 × 10^{2} 1.370  0.000  1.370 Minimum ionization
300. MeV 3.917 × 10^{2} 1.372  0.000  0.000  1.373  1.905 × 10^{2}
400. MeV 4.945 × 10^{2} 1.389  0.000  0.000  1.389  2.629 × 10^{2}
800. MeV 8.995 × 10^{2} 1.471  0.001  0.000  1.472  5.424 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.504  0.001  0.000  1.506  6.767 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.558  0.001  0.000  0.001  1.560  9.375 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.615  0.002  0.001  0.001  1.619  1.315 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.681  0.003  0.002  0.001  1.688  1.919 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.726  0.005  0.004  0.002  1.737  2.502 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.828  0.012  0.012  0.003  1.856  4.722 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.859  0.016  0.017  0.004  1.896  5.788 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.903  0.024  0.027  0.006  1.960  7.861 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.947  0.037  0.044  0.008  2.037  1.086 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.994  0.061  0.076  0.012  2.144  1.564 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.026  0.086  0.111  0.016  2.239  2.021 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.096  0.195  0.266  0.030  2.588  3.679 × 10^{4}
100. GeV 1.001 × 10^{5} 2.117  0.253  0.350  0.038  2.758  4.428 × 10^{4}
140. GeV 1.401 × 10^{5} 2.148  0.371  0.523  0.052  3.095  5.796 × 10^{4}
200. GeV 2.001 × 10^{5} 2.181  0.556  0.796  0.075  3.609  7.590 × 10^{4}
297. GeV 2.975 × 10^{5} 2.217  0.865  1.242  0.111  4.435 Muon critical energy
300. GeV 3.001 × 10^{5} 2.218  0.873  1.254  0.112  4.458  1.008 × 10^{5}
400. GeV 4.001 × 10^{5} 2.244  1.201  1.729  0.149  5.323  1.213 × 10^{5}
800. GeV 8.001 × 10^{5} 2.307  2.557  3.678  0.301  8.844  1.790 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.327  3.254  4.676  0.378  10.637  1.996 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.358  4.653  6.668  0.536  14.216  2.320 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.392  6.794  9.710  0.776  19.672  2.678 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.431  10.371  14.765  1.187  28.754  3.096 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.458  13.998  19.877  1.604  37.938  3.398 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.527  28.635  40.432  3.336  74.930  4.134 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.549  36.015  50.767  4.226  93.558  4.372 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.583  50.736  71.386  6.054 130.761  4.732 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.620  72.958 102.454  8.856 186.889  5.114 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.663 109.952 154.146  13.702 280.464  5.548 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.694 147.090 205.967  18.665 374.417  5.855 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.770 295.896 413.408  39.403 751.478  6.595 × 10^{5}
100. TeV 1.000 × 10^{8} 2.795 370.440 517.230  50.120 940.586  6.832 × 10^{5}