Muons in gel in photographic emulsion

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.53973 & 1.291 & 74.8 & 0.10102 & 3.4418 & 0.1709 & 2.7058 & 3.2687 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.747  7.747  7.134 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.043  6.043  1.304 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.719  4.719  2.441 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.661  3.661  4.880 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.126  3.126  7.855 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.347  2.347  2.309 × 10^{1}
100. MeV 1.764 × 10^{2} 2.200  2.200  3.191 × 10^{1}
140. MeV 2.218 × 10^{2} 2.048  2.048  5.085 × 10^{1}
200. MeV 2.868 × 10^{2} 1.960  1.960  8.091 × 10^{1}
300. MeV 3.917 × 10^{2} 1.926  0.000  1.926  1.325 × 10^{2}
318. MeV 4.105 × 10^{2} 1.926  0.000  1.926 Minimum ionization
400. MeV 4.945 × 10^{2} 1.932  0.000  1.932  1.844 × 10^{2}
800. MeV 8.995 × 10^{2} 2.004  0.000  0.000  2.004  3.877 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.037  0.000  0.000  2.038  4.867 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.091  0.000  0.001  2.092  6.803 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.150  0.001  0.000  0.001  2.152  9.629 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.218  0.001  0.001  0.001  2.221  1.420 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.265  0.001  0.001  0.002  2.269  1.865 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.373  0.003  0.003  0.004  2.383  3.580 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.406  0.004  0.004  0.005  2.419  4.412 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.453  0.007  0.007  0.007  2.474  6.046 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.501  0.010  0.012  0.009  2.533  8.441 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.553  0.017  0.021  0.014  2.605  1.233 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.589  0.024  0.031  0.018  2.662  1.613 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.670  0.055  0.075  0.034  2.835  3.066 × 10^{4}
100. GeV 1.001 × 10^{5} 2.696  0.072  0.098  0.043  2.909  3.763 × 10^{4}
140. GeV 1.401 × 10^{5} 2.733  0.106  0.148  0.059  3.047  5.106 × 10^{4}
200. GeV 2.001 × 10^{5} 2.773  0.160  0.226  0.084  3.243  7.014 × 10^{4}
300. GeV 3.001 × 10^{5} 2.818  0.253  0.360  0.126  3.556  9.957 × 10^{4}
400. GeV 4.001 × 10^{5} 2.850  0.349  0.499  0.167  3.865  1.265 × 10^{5}
800. GeV 8.001 × 10^{5} 2.927  0.749  1.078  0.338  5.092  2.164 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.952  0.956  1.377  0.425  5.710  2.535 × 10^{5}
1.07 TeV 1.068 × 10^{6} 2.959  1.026  1.478  0.455  5.919 Muon critical energy
1.40 TeV 1.400 × 10^{6} 2.990  1.373  1.973  0.602  6.939  3.169 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.031  2.013  2.887  0.872  8.804  3.936 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.079  3.087  4.408  1.337  11.910  4.909 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.113  4.180  5.950  1.809  15.052  5.654 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.196  8.606  12.163  3.776  27.742  7.582 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.224  10.845  15.292  4.790  34.151  8.231 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.266  15.312  21.527  6.878  46.984  9.225 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.311  22.072  30.932  10.087  66.402  1.029 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.363  33.326  46.580  15.657  98.927  1.152 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.401  44.642  62.279  21.375 131.697  1.239 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.494  90.017 125.128  45.375 264.014  1.450 × 10^{6}
100. TeV 1.000 × 10^{8} 3.525 112.766 156.590  57.818 330.698  1.517 × 10^{6}