Muons in gallium arsenide (GaAs)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.44247 & 5.310 & 384.9 & 0.07152 & 3.3356 & 0.1764 & 3.6420 & 5.3299 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.006  5.006  1.126 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.944  3.944  2.036 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.109  3.109  3.768 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.436  2.436  7.450 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.093  2.093  1.191 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.595  1.595  3.447 × 10^{1}
100. MeV 1.764 × 10^{2} 1.506  1.506  4.740 × 10^{1}
140. MeV 2.218 × 10^{2} 1.419  1.419  7.489 × 10^{1}
200. MeV 2.868 × 10^{2} 1.375  1.375  1.180 × 10^{2}
256. MeV 3.462 × 10^{2} 1.368  0.000  1.368 Minimum ionization
300. MeV 3.917 × 10^{2} 1.371  0.000  0.000  1.371  1.910 × 10^{2}
400. MeV 4.945 × 10^{2} 1.388  0.000  0.000  1.388  2.635 × 10^{2}
800. MeV 8.995 × 10^{2} 1.472  0.001  0.000  1.473  5.430 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.506  0.001  0.000  1.507  6.772 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.560  0.001  0.000  0.001  1.562  9.376 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.619  0.002  0.001  0.001  1.623  1.314 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.685  0.003  0.002  0.001  1.692  1.917 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.731  0.005  0.004  0.002  1.741  2.499 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.834  0.012  0.012  0.003  1.862  4.712 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.865  0.016  0.017  0.004  1.902  5.774 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.910  0.024  0.027  0.006  1.967  7.840 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.955  0.038  0.044  0.008  2.045  1.083 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.002  0.061  0.076  0.012  2.152  1.559 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.034  0.087  0.112  0.016  2.248  2.014 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.105  0.196  0.268  0.030  2.599  3.665 × 10^{4}
100. GeV 1.001 × 10^{5} 2.126  0.254  0.352  0.038  2.770  4.411 × 10^{4}
140. GeV 1.401 × 10^{5} 2.158  0.373  0.525  0.052  3.109  5.773 × 10^{4}
200. GeV 2.001 × 10^{5} 2.191  0.559  0.800  0.075  3.624  7.559 × 10^{4}
297. GeV 2.974 × 10^{5} 2.227  0.869  1.247  0.111  4.454 Muon critical energy
300. GeV 3.001 × 10^{5} 2.227  0.877  1.260  0.112  4.477  1.004 × 10^{5}
400. GeV 4.001 × 10^{5} 2.254  1.207  1.736  0.149  5.347  1.208 × 10^{5}
800. GeV 8.001 × 10^{5} 2.317  2.569  3.695  0.301  8.882  1.783 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.337  3.269  4.697  0.379  10.683  1.988 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.369  4.674  6.698  0.536  14.279  2.310 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.402  6.826  9.754  0.776  19.759  2.666 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.441  10.420  14.832  1.187  28.881  3.083 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.469  14.064  19.967  1.604  38.105  3.383 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.538  28.769  40.614  3.337  75.259  4.116 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.560  36.183  50.996  4.227  93.968  4.353 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.595  50.974  71.708  6.055 131.333  4.712 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.632  73.300 102.915  8.858 187.706  5.092 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.675 110.466 154.840  13.706 281.687  5.524 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.706 147.777 206.895  18.671 376.049  5.830 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.782 297.278 415.267  39.417 754.746  6.566 × 10^{5}
100. TeV 1.000 × 10^{8} 2.807 372.171 519.555  50.139 944.673  6.802 × 10^{5}