Muons in gallium (Ga)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
31 (Ga) 69.723(1)  5.904  334.0 0.09440 3.1314 0.2267 3.5434 4.9353  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.119  5.119  1.104 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.034  4.034  1.993 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.179  3.179  3.687 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.488  2.488  7.290 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.136  2.136  1.166 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.620  1.620  3.382 × 10^{1}
100. MeV 1.764 × 10^{2} 1.528  1.528  4.656 × 10^{1}
140. MeV 2.218 × 10^{2} 1.436  1.436  7.369 × 10^{1}
200. MeV 2.868 × 10^{2} 1.388  1.389  1.163 × 10^{2}
263. MeV 3.527 × 10^{2} 1.379  0.000  1.379 Minimum ionization
300. MeV 3.917 × 10^{2} 1.381  0.000  1.381  1.887 × 10^{2}
400. MeV 4.945 × 10^{2} 1.396  0.000  0.000  1.397  2.608 × 10^{2}
800. MeV 8.995 × 10^{2} 1.477  0.001  0.000  1.478  5.390 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.510  0.001  0.000  1.512  6.727 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.564  0.001  0.000  0.001  1.566  9.325 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.622  0.002  0.001  0.001  1.625  1.308 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.687  0.003  0.002  0.001  1.694  1.910 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.733  0.005  0.004  0.002  1.743  2.491 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.836  0.012  0.012  0.003  1.863  4.702 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.867  0.015  0.016  0.004  1.904  5.764 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.912  0.024  0.026  0.006  1.968  7.829 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.957  0.037  0.043  0.008  2.045  1.082 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.005  0.060  0.074  0.012  2.151  1.558 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.036  0.085  0.109  0.016  2.246  2.013 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.107  0.191  0.261  0.030  2.591  3.668 × 10^{4}
100. GeV 1.001 × 10^{5} 2.129  0.248  0.343  0.038  2.758  4.416 × 10^{4}
140. GeV 1.401 × 10^{5} 2.161  0.364  0.512  0.053  3.090  5.785 × 10^{4}
200. GeV 2.001 × 10^{5} 2.194  0.545  0.780  0.075  3.595  7.584 × 10^{4}
300. GeV 3.001 × 10^{5} 2.231  0.856  1.230  0.112  4.429  1.009 × 10^{5}
304. GeV 3.043 × 10^{5} 2.232  0.870  1.249  0.114  4.465 Muon critical energy
400. GeV 4.001 × 10^{5} 2.257  1.177  1.695  0.149  5.280  1.215 × 10^{5}
800. GeV 8.001 × 10^{5} 2.321  2.507  3.607  0.302  8.737  1.798 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.341  3.190  4.586  0.380  10.498  2.007 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.373  4.562  6.540  0.538  14.014  2.336 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.407  6.661  9.525  0.778  19.372  2.698 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.446  10.169  14.484  1.190  28.291  3.123 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.474  13.727  19.499  1.609  37.310  3.430 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.543  28.082  39.666  3.347  73.638  4.179 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.565  35.321  49.806  4.240  91.933  4.421 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.600  49.760  70.036  6.074 128.470  4.788 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.637  71.556 100.516  8.886 183.596  5.177 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.680 107.841 151.232  13.750 275.504  5.618 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.711 144.268 202.076  18.731 367.787  5.931 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.788 290.229 405.605  39.550 738.173  6.684 × 10^{5}
100. TeV 1.000 × 10^{8} 2.813 363.350 507.470  50.310 923.944  6.925 × 10^{5}