Muons in gadolinium oxysulfide (Gd_{2}O_{2}S)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.42266 & 7.440 & 493.3 & 0.22161 & 2.6300 & −0.1774 & 3.4045 & 5.5347 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.587  4.587  1.234 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.621  3.621  2.225 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.860  2.860  4.110 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.244  2.244  8.109 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.929  1.929  1.294 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.466  1.466  3.745 × 10^{1}
100. MeV 1.764 × 10^{2} 1.384  1.384  5.153 × 10^{1}
140. MeV 2.218 × 10^{2} 1.303  1.303  8.145 × 10^{1}
200. MeV 2.868 × 10^{2} 1.263  1.263  1.284 × 10^{2}
253. MeV 3.431 × 10^{2} 1.257  0.000  1.257 Minimum ionization
300. MeV 3.917 × 10^{2} 1.260  0.000  0.000  1.261  2.078 × 10^{2}
400. MeV 4.945 × 10^{2} 1.278  0.000  0.000  1.278  2.866 × 10^{2}
800. MeV 8.995 × 10^{2} 1.360  0.001  0.000  1.361  5.895 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.393  0.001  0.000  1.395  7.346 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.447  0.002  0.000  0.001  1.449  1.016 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.505  0.003  0.001  0.001  1.510  1.421 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.571  0.005  0.003  0.001  1.580  2.067 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.616  0.007  0.005  0.002  1.631  2.690 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.720  0.018  0.017  0.003  1.759  5.042 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.752  0.024  0.024  0.004  1.804  6.164 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.797  0.037  0.039  0.005  1.878  8.335 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.842  0.057  0.064  0.008  1.970  1.145 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.889  0.093  0.111  0.011  2.105  1.636 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.921  0.131  0.163  0.015  2.231  2.097 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.991  0.297  0.392  0.029  2.710  3.720 × 10^{4}
100. GeV 1.001 × 10^{5} 2.012  0.385  0.516  0.036  2.950  4.427 × 10^{4}
140. GeV 1.401 × 10^{5} 2.042  0.565  0.771  0.050  3.429  5.684 × 10^{4}
198. GeV 1.985 × 10^{5} 2.073  0.839  1.163  0.071  4.147 Muon critical energy
200. GeV 2.001 × 10^{5} 2.074  0.847  1.174  0.072  4.167  7.270 × 10^{4}
300. GeV 3.001 × 10^{5} 2.109  1.328  1.848  0.108  5.394  9.374 × 10^{4}
400. GeV 4.001 × 10^{5} 2.134  1.826  2.546  0.143  6.650  1.104 × 10^{5}
800. GeV 8.001 × 10^{5} 2.194  3.880  5.410  0.290  11.776  1.550 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.214  4.935  6.876  0.364  14.391  1.704 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.244  7.050  9.799  0.516  19.610  1.941 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.276  10.285  14.259  0.747  27.568  2.198 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.313  15.685  21.671  1.142  40.812  2.494 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.340  21.157  29.163  1.543  54.203  2.706 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.405  43.215  59.276  3.206 108.103  3.219 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.427  54.330  74.412  4.060 135.231  3.384 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.460  76.500 104.614  5.815 189.390  3.633 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.495 109.951 150.110  8.504 271.061  3.896 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.536 165.634 225.807  13.152 407.131  4.195 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.566 221.515 301.684  17.910 543.676  4.407 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.639 445.373 605.398  37.781 1091.192  4.916 × 10^{5}
100. TeV 1.000 × 10^{8} 2.663 557.489 757.394  48.044 1365.591  5.079 × 10^{5}