Muons in gadolinium (Gd)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
64 (Gd) 157.25(3)  7.901  591.0 0.25109 2.5977 0.1058 3.3932 5.8737  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.225  4.225  1.357 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.350  3.350  2.430 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.655  2.655  4.463 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.088  2.088  8.765 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.798  1.798  1.396 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.372  1.372  4.020 × 10^{1}
100. MeV 1.764 × 10^{2} 1.297  1.297  5.523 × 10^{1}
140. MeV 2.218 × 10^{2} 1.225  1.226  8.709 × 10^{1}
200. MeV 2.868 × 10^{2} 1.192  1.192  1.369 × 10^{2}
243. MeV 3.325 × 10^{2} 1.188  0.000  1.188 Minimum ionization
300. MeV 3.917 × 10^{2} 1.193  0.000  0.000  1.193  2.210 × 10^{2}
400. MeV 4.945 × 10^{2} 1.212  0.000  0.000  1.212  3.042 × 10^{2}
800. MeV 8.995 × 10^{2} 1.295  0.001  0.000  1.296  6.228 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.328  0.001  0.000  1.330  7.751 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.381  0.002  0.000  0.001  1.384  1.070 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.439  0.003  0.001  0.001  1.444  1.493 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.504  0.006  0.003  0.001  1.514  2.169 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.549  0.008  0.006  0.002  1.565  2.818 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.651  0.021  0.019  0.003  1.695  5.264 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.682  0.027  0.027  0.004  1.741  6.427 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.726  0.042  0.044  0.005  1.818  8.674 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.770  0.065  0.072  0.007  1.916  1.189 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.817  0.106  0.127  0.011  2.061  1.691 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.847  0.150  0.186  0.015  2.199  2.161 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.915  0.339  0.447  0.028  2.731  3.790 × 10^{4}
100. GeV 1.001 × 10^{5} 1.936  0.439  0.588  0.035  2.999  4.488 × 10^{4}
140. GeV 1.401 × 10^{5} 1.965  0.645  0.878  0.049  3.538  5.715 × 10^{4}
171. GeV 1.712 × 10^{5} 1.982  0.810  1.113  0.060  3.966 Muon critical energy
200. GeV 2.001 × 10^{5} 1.995  0.966  1.337  0.070  4.370  7.239 × 10^{4}
300. GeV 3.001 × 10^{5} 2.029  1.515  2.104  0.105  5.754  9.229 × 10^{4}
400. GeV 4.001 × 10^{5} 2.053  2.082  2.899  0.140  7.175  1.078 × 10^{5}
800. GeV 8.001 × 10^{5} 2.112  4.423  6.156  0.283  12.975  1.487 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.130  5.626  7.822  0.355  15.935  1.626 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.159  8.035  11.145  0.503  21.844  1.840 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.190  11.720  16.216  0.727  30.855  2.070 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.226  17.869  24.642  1.112  45.851  2.334 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.252  24.100  33.156  1.502  61.012  2.522 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.315  49.215  67.381  3.120 122.032  2.977 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.335  61.868  84.583  3.950 152.738  3.123 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.367  87.107 118.908  5.654 214.037  3.343 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.401 125.182 170.612  8.266 306.463  3.576 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.441 188.567 256.638  12.776 460.423  3.841 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.469 252.173 342.864  17.391 614.900  4.028 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.539 506.966 688.005  36.649 1234.160  4.478 × 10^{5}
100. TeV 1.000 × 10^{8} 2.562 634.570 860.730  46.590 1544.454  4.623 × 10^{5}