Muons in fluorine gas (F_{2})

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
9 (F) 18.998403163(6) 1.580 × 10^{−3} 115.0 0.11083 3.2962 1.8433 4.4096 10.9653 0.00
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 6.415  6.415  8.663 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 5.017  5.017  1.579 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.927  3.927  2.946 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.054  3.054  5.874 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.611  2.611  9.438 × 10^{0}
80.0 MeV 1.527 × 10^{2} 1.967  1.967  2.764 × 10^{1}
100. MeV 1.764 × 10^{2} 1.852  1.853  3.815 × 10^{1}
140. MeV 2.218 × 10^{2} 1.740  1.741  6.052 × 10^{1}
200. MeV 2.868 × 10^{2} 1.685  1.685  9.569 × 10^{1}
252. MeV 3.421 × 10^{2} 1.676  0.000  1.676 Minimum ionization
300. MeV 3.917 × 10^{2} 1.680  0.000  1.681  1.553 × 10^{2}
400. MeV 4.945 × 10^{2} 1.705  0.000  1.705  2.144 × 10^{2}
800. MeV 8.995 × 10^{2} 1.824  0.000  0.000  1.825  4.409 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.874  0.000  0.000  1.874  5.490 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.955  0.000  0.000  0.001  1.956  7.577 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.046  0.001  0.000  0.001  2.048  1.057 × 10^{3}
3.00 GeV 3.104 × 10^{3} 2.154  0.001  0.001  0.001  2.157  1.532 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.231  0.002  0.001  0.002  2.236  1.987 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.413  0.004  0.004  0.004  2.425  3.695 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.461  0.005  0.005  0.005  2.477  4.511 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.529  0.008  0.009  0.006  2.553  6.100 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.596  0.013  0.015  0.009  2.632  8.413 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.665  0.021  0.026  0.013  2.725  1.214 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.710  0.030  0.038  0.017  2.795  1.576 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.808  0.067  0.091  0.033  3.000  2.955 × 10^{4}
100. GeV 1.001 × 10^{5} 2.837  0.087  0.120  0.041  3.086  3.612 × 10^{4}
140. GeV 1.401 × 10^{5} 2.878  0.129  0.180  0.057  3.244  4.875 × 10^{4}
200. GeV 2.001 × 10^{5} 2.919  0.194  0.275  0.082  3.470  6.663 × 10^{4}
300. GeV 3.001 × 10^{5} 2.963  0.305  0.436  0.122  3.828  9.406 × 10^{4}
400. GeV 4.001 × 10^{5} 2.994  0.421  0.604  0.163  4.182  1.190 × 10^{5}
800. GeV 8.001 × 10^{5} 3.065  0.901  1.301  0.329  5.597  2.014 × 10^{5}
960. GeV 9.600 × 10^{5} 3.084  1.099  1.588  0.397  6.167 Muon critical energy
1.00 TeV 1.000 × 10^{6} 3.088  1.149  1.661  0.414  6.311  2.351 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.122  1.648  2.375  0.587  7.732  2.922 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.158  2.413  3.470  0.850  9.891  3.607 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.199  3.695  5.292  1.301  13.488  4.470 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.229  4.998  7.138  1.761  17.126  5.126 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.303  10.269  14.569  3.672  31.813  6.813 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.327  12.932  18.311  4.656  39.226  7.379 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.364  18.245  25.768  6.682  54.058  8.244 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.403  26.276  37.012  9.792  76.484  9.172 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.449  39.648  55.724  15.187 114.008  1.024 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.482  53.085  74.493  20.722 151.782  1.099 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.564 106.962 149.635  43.923 304.085  1.282 × 10^{6}
100. TeV 1.000 × 10^{8} 3.591 133.970 187.250  55.940 380.751  1.341 × 10^{6}