Muons in ferrous sulfate dosimeter solution

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.55329 & 1.024 & 76.4 & 0.08759 & 3.4923 & 0.2378 & 2.8254 & 3.5183 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.920  7.920  6.979 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.179  6.179  1.276 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.826  4.826  2.387 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.744  3.744  4.773 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.197  3.197  7.682 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.401  2.401  2.258 × 10^{1}
100. MeV 1.764 × 10^{2} 2.258  2.258  3.119 × 10^{1}
140. MeV 2.218 × 10^{2} 2.105  2.105  4.962 × 10^{1}
200. MeV 2.868 × 10^{2} 2.016  2.016  7.885 × 10^{1}
300. MeV 3.917 × 10^{2} 1.982  0.000  1.982  1.290 × 10^{2}
318. MeV 4.105 × 10^{2} 1.982  0.000  1.982 Minimum ionization
400. MeV 4.945 × 10^{2} 1.989  0.000  1.989  1.794 × 10^{2}
800. MeV 8.995 × 10^{2} 2.064  0.000  0.000  2.065  3.769 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.099  0.000  0.000  2.100  4.729 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.155  0.000  0.001  2.156  6.608 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.217  0.001  0.000  0.001  2.219  9.348 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.287  0.001  0.001  0.001  2.291  1.378 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.336  0.002  0.001  0.002  2.341  1.809 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.448  0.004  0.003  0.004  2.460  3.471 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.482  0.005  0.005  0.005  2.497  4.278 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.532  0.007  0.008  0.007  2.554  5.861 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.581  0.012  0.013  0.009  2.616  8.181 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.635  0.019  0.023  0.013  2.691  1.195 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.671  0.027  0.034  0.018  2.750  1.562 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.755  0.061  0.082  0.034  2.933  2.968 × 10^{4}
100. GeV 1.001 × 10^{5} 2.781  0.079  0.109  0.042  3.012  3.641 × 10^{4}
140. GeV 1.401 × 10^{5} 2.820  0.117  0.163  0.059  3.159  4.938 × 10^{4}
200. GeV 2.001 × 10^{5} 2.860  0.176  0.250  0.083  3.370  6.776 × 10^{4}
300. GeV 3.001 × 10^{5} 2.906  0.278  0.396  0.125  3.706  9.604 × 10^{4}
400. GeV 4.001 × 10^{5} 2.939  0.384  0.549  0.167  4.039  1.219 × 10^{5}
800. GeV 8.001 × 10^{5} 3.018  0.825  1.186  0.337  5.366  2.075 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.044  1.052  1.515  0.423  6.035  2.426 × 10^{5}
1.02 TeV 1.017 × 10^{6} 3.046  1.072  1.543  0.431  6.092 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.083  1.510  2.170  0.600  7.364  3.025 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.125  2.215  3.173  0.869  9.382  3.746 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.173  3.395  4.843  1.331  12.743  4.657 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.208  4.596  6.536  1.801  16.142  5.353 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.294  9.457  13.354  3.760  29.866  7.147 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.322  11.916  16.788  4.768  36.795  7.749 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.365  16.823  23.631  6.847  50.666  8.672 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.412  24.246  33.950  10.040  71.649  9.663 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.466  36.606  51.121  15.583 106.776  1.080 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.504  49.032  68.347  21.272 142.156  1.161 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.600  98.877 137.309  45.146 284.931  1.356 × 10^{6}
100. TeV 1.000 × 10^{8} 3.631 123.872 171.829  57.521 356.854  1.418 × 10^{6}