Muons in ferrous oxide (FeO)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47323 & 5.700 & 248.6 & 0.12959 & 3.0168 & −0.0279 & 3.2002 & 4.3175 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.738  5.738  9.763 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.506  4.506  1.771 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.542  3.542  3.289 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.766  2.766  6.527 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.372  2.372  1.046 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.786  1.786  3.050 × 10^{1}
100. MeV 1.764 × 10^{2} 1.679  1.680  4.207 × 10^{1}
140. MeV 2.218 × 10^{2} 1.574  1.574  6.679 × 10^{1}
200. MeV 2.868 × 10^{2} 1.517  1.517  1.058 × 10^{2}
277. MeV 3.683 × 10^{2} 1.503  0.000  1.503 Minimum ionization
300. MeV 3.917 × 10^{2} 1.504  0.000  1.504  1.721 × 10^{2}
400. MeV 4.945 × 10^{2} 1.518  0.000  0.000  1.518  2.384 × 10^{2}
800. MeV 8.995 × 10^{2} 1.598  0.000  0.000  1.599  4.950 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.631  0.001  0.000  1.633  6.188 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.686  0.001  0.000  0.001  1.688  8.596 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.745  0.001  0.001  0.001  1.748  1.209 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.812  0.003  0.002  0.001  1.818  1.769 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.858  0.004  0.003  0.002  1.867  2.311 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.964  0.009  0.009  0.004  1.986  4.381 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.996  0.012  0.012  0.004  2.025  5.378 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.042  0.018  0.020  0.006  2.087  7.322 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.088  0.028  0.033  0.008  2.158  1.015 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.137  0.046  0.057  0.012  2.253  1.468 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.169  0.065  0.084  0.016  2.335  1.904 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.243  0.147  0.201  0.032  2.622  3.518 × 10^{4}
100. GeV 1.001 × 10^{5} 2.265  0.191  0.264  0.039  2.759  4.261 × 10^{4}
140. GeV 1.401 × 10^{5} 2.298  0.280  0.394  0.055  3.028  5.644 × 10^{4}
200. GeV 2.001 × 10^{5} 2.333  0.420  0.601  0.077  3.432  7.505 × 10^{4}
300. GeV 3.001 × 10^{5} 2.372  0.660  0.948  0.116  4.097  1.017 × 10^{5}
400. GeV 4.001 × 10^{5} 2.400  0.908  1.308  0.155  4.772  1.243 × 10^{5}
405. GeV 4.047 × 10^{5} 2.401  0.920  1.325  0.157  4.803 Muon critical energy
800. GeV 8.001 × 10^{5} 2.468  1.936  2.789  0.313  7.507  1.906 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.490  2.465  3.549  0.393  8.898  2.150 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.523  3.527  5.065  0.557  11.673  2.542 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.559  5.153  7.380  0.806  15.900  2.980 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.601  7.872  11.230  1.234  22.937  3.501 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.631  10.630  15.124  1.669  30.055  3.881 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.704  21.766  30.788  3.474  58.733  4.816 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.728  27.384  38.666  4.403  73.182  5.120 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.765  38.590  54.381  6.311 102.049  5.581 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.805  55.512  78.063  9.240 145.621  6.071 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.851  83.684 117.467  14.310 218.313  6.628 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.884 111.972 156.974  19.507 291.337  7.023 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.965 225.335 315.126  41.247 584.675  7.973 × 10^{5}
100. TeV 1.000 × 10^{8} 2.992 282.133 394.282  52.492 731.901  8.278 × 10^{5}