Muons in ferroboride (FeB)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.46507 & 7.150 & 261.0 & 0.12911 & 3.0240 & −0.0988 & 3.1749 & 4.2057 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.597  5.597  1.002 × 10^{0}
14.0 MeV 5.616 × 10^{1} 4.397  4.397  1.816 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.457  3.457  3.372 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.701  2.701  6.689 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.313  2.313  1.072 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.741  1.741  3.127 × 10^{1}
100. MeV 1.764 × 10^{2} 1.637  1.638  4.315 × 10^{1}
140. MeV 2.218 × 10^{2} 1.534  1.534  6.850 × 10^{1}
200. MeV 2.868 × 10^{2} 1.479  1.480  1.085 × 10^{2}
277. MeV 3.673 × 10^{2} 1.466  0.000  1.466 Minimum ionization
300. MeV 3.917 × 10^{2} 1.467  0.000  1.467  1.765 × 10^{2}
400. MeV 4.945 × 10^{2} 1.480  0.000  0.000  1.481  2.444 × 10^{2}
800. MeV 8.995 × 10^{2} 1.559  0.000  0.000  1.559  5.076 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.592  0.001  0.000  1.593  6.344 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.644  0.001  0.000  0.001  1.646  8.813 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.702  0.001  0.001  0.001  1.706  1.239 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.768  0.003  0.002  0.001  1.774  1.813 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.813  0.004  0.003  0.002  1.822  2.369 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.917  0.009  0.009  0.004  1.939  4.489 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.948  0.012  0.013  0.004  1.977  5.511 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.993  0.018  0.020  0.006  2.038  7.502 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.038  0.029  0.033  0.008  2.108  1.039 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.085  0.047  0.058  0.012  2.203  1.503 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.117  0.066  0.085  0.016  2.285  1.949 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.189  0.150  0.204  0.032  2.575  3.595 × 10^{4}
100. GeV 1.001 × 10^{5} 2.211  0.194  0.268  0.039  2.713  4.351 × 10^{4}
140. GeV 1.401 × 10^{5} 2.244  0.285  0.401  0.054  2.985  5.756 × 10^{4}
200. GeV 2.001 × 10^{5} 2.278  0.427  0.611  0.077  3.394  7.640 × 10^{4}
300. GeV 3.001 × 10^{5} 2.316  0.671  0.964  0.116  4.068  1.033 × 10^{5}
390. GeV 3.901 × 10^{5} 2.341  0.898  1.293  0.151  4.684 Muon critical energy
400. GeV 4.001 × 10^{5} 2.344  0.923  1.330  0.155  4.753  1.260 × 10^{5}
800. GeV 8.001 × 10^{5} 2.410  1.968  2.835  0.312  7.527  1.923 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.432  2.505  3.607  0.392  8.938  2.167 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.465  3.584  5.147  0.556  11.753  2.556 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.500  5.237  7.500  0.805  16.043  2.991 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.541  7.999  11.411  1.232  23.184  3.507 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.570  10.801  15.368  1.666  30.406  3.883 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.643  22.113  31.281  3.469  59.507  4.806 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.666  27.820  39.285  4.397  74.168  5.106 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.703  39.203  55.250  6.302 103.459  5.561 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.741  56.391  79.309  9.226 147.669  6.044 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.787  85.006 119.338  14.289 221.421  6.593 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.819 113.738 159.473  19.478 295.509  6.983 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.899 228.875 320.135  41.187 593.097  7.920 × 10^{5}
100. TeV 1.000 × 10^{8} 2.926 286.559 400.547  52.416 742.448  8.220 × 10^{5}