Muons in ferric oxide (Fe_{2}O_{3})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.47592 & 5.200 & 227.3 & 0.10478 & 3.1313 & −0.0074 & 3.2573 & 4.2245 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 5.849  5.849  9.565 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 4.591  4.591  1.736 × 10^{0}
20.0 MeV 6.802 × 10^{1} 3.607  3.607  3.227 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.815  2.815  6.408 × 10^{0}
40.0 MeV 1.003 × 10^{2} 2.414  2.414  1.027 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.816  1.816  2.997 × 10^{1}
100. MeV 1.764 × 10^{2} 1.707  1.707  4.135 × 10^{1}
140. MeV 2.218 × 10^{2} 1.599  1.599  6.568 × 10^{1}
200. MeV 2.868 × 10^{2} 1.540  1.540  1.041 × 10^{2}
277. MeV 3.683 × 10^{2} 1.525  0.000  1.525 Minimum ionization
300. MeV 3.917 × 10^{2} 1.526  0.000  1.526  1.695 × 10^{2}
400. MeV 4.945 × 10^{2} 1.539  0.000  0.000  1.539  2.348 × 10^{2}
800. MeV 8.995 × 10^{2} 1.618  0.000  0.000  1.619  4.881 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.651  0.001  0.000  1.652  6.104 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.705  0.001  0.000  0.001  1.707  8.484 × 10^{2}
2.00 GeV 2.103 × 10^{3} 1.764  0.001  0.001  0.001  1.767  1.193 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.831  0.002  0.002  0.001  1.836  1.748 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.877  0.003  0.003  0.002  1.885  2.285 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.983  0.008  0.008  0.004  2.004  4.336 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.015  0.011  0.012  0.004  2.042  5.324 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.060  0.017  0.019  0.006  2.103  7.253 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.106  0.027  0.031  0.008  2.173  1.006 × 10^{4}
30.0 GeV 3.011 × 10^{4} 2.155  0.044  0.054  0.012  2.265  1.456 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.188  0.061  0.079  0.016  2.345  1.890 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.262  0.139  0.189  0.032  2.622  3.500 × 10^{4}
100. GeV 1.001 × 10^{5} 2.284  0.180  0.249  0.039  2.753  4.245 × 10^{4}
140. GeV 1.401 × 10^{5} 2.318  0.264  0.372  0.055  3.009  5.634 × 10^{4}
200. GeV 2.001 × 10^{5} 2.353  0.397  0.567  0.078  3.395  7.510 × 10^{4}
300. GeV 3.001 × 10^{5} 2.392  0.623  0.895  0.117  4.027  1.021 × 10^{5}
400. GeV 4.001 × 10^{5} 2.420  0.858  1.235  0.156  4.669  1.252 × 10^{5}
429. GeV 4.288 × 10^{5} 2.427  0.926  1.334  0.167  4.854 Muon critical energy
800. GeV 8.001 × 10^{5} 2.488  1.829  2.634  0.315  7.267  1.933 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.510  2.328  3.353  0.396  8.587  2.186 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.544  3.332  4.785  0.561  11.222  2.592 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.580  4.869  6.974  0.811  15.235  3.050 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.622  7.438  10.613  1.242  21.916  3.594 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.652  10.046  14.294  1.680  28.672  3.992 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.726  20.573  29.102  3.498  55.900  4.973 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.750  25.884  36.551  4.433  69.619  5.293 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.787  36.479  51.407  6.356  97.030  5.778 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.827  52.479  73.797  9.306 138.409  6.293 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.873  79.115 111.050  14.416 207.454  6.879 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.906 105.861 148.403  19.653 276.824  7.295 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.989 213.054 297.929  41.568 555.540  8.295 × 10^{5}
100. TeV 1.000 × 10^{8} 3.016 266.761 372.768  52.906 695.452  8.616 × 10^{5}