Muons in eye lens (ICRP)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54977 & 1.100 & 73.3 & 0.09690 & 3.4550 & 0.2070 & 2.7446 & 3.3720 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.912  7.912  6.984 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.171  6.171  1.277 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.819  4.819  2.390 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.738  3.738  4.779 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.192  3.192  7.693 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.396  2.396  2.262 × 10^{1}
100. MeV 1.764 × 10^{2} 2.251  2.251  3.125 × 10^{1}
140. MeV 2.218 × 10^{2} 2.095  2.096  4.976 × 10^{1}
200. MeV 2.868 × 10^{2} 2.006  2.006  7.914 × 10^{1}
300. MeV 3.917 × 10^{2} 1.971  0.000  1.971  1.296 × 10^{2}
318. MeV 4.105 × 10^{2} 1.971  0.000  1.971 Minimum ionization
400. MeV 4.945 × 10^{2} 1.977  0.000  1.977  1.803 × 10^{2}
800. MeV 8.995 × 10^{2} 2.051  0.000  0.000  2.051  3.790 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.085  0.000  0.000  2.085  4.756 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.140  0.000  0.001  2.141  6.648 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.201  0.001  0.000  0.001  2.203  9.409 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.270  0.001  0.001  0.001  2.273  1.387 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.318  0.001  0.001  0.002  2.323  1.822 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.429  0.003  0.003  0.004  2.439  3.498 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.462  0.005  0.005  0.005  2.476  4.311 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.511  0.007  0.008  0.007  2.532  5.908 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.560  0.011  0.012  0.009  2.593  8.248 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.613  0.018  0.022  0.014  2.666  1.205 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.649  0.025  0.032  0.018  2.724  1.576 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.732  0.058  0.078  0.034  2.902  2.996 × 10^{4}
100. GeV 1.001 × 10^{5} 2.758  0.075  0.102  0.042  2.978  3.676 × 10^{4}
140. GeV 1.401 × 10^{5} 2.796  0.111  0.154  0.059  3.120  4.988 × 10^{4}
200. GeV 2.001 × 10^{5} 2.837  0.167  0.236  0.084  3.323  6.851 × 10^{4}
300. GeV 3.001 × 10^{5} 2.882  0.263  0.374  0.125  3.645  9.723 × 10^{4}
400. GeV 4.001 × 10^{5} 2.915  0.363  0.519  0.167  3.964  1.235 × 10^{5}
800. GeV 8.001 × 10^{5} 2.993  0.779  1.121  0.338  5.232  2.111 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.019  0.994  1.432  0.424  5.870  2.471 × 10^{5}
1.06 TeV 1.057 × 10^{6} 3.025  1.056  1.520  0.449  6.051 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.058  1.428  2.052  0.602  7.139  3.088 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.100  2.094  3.001  0.871  9.066  3.833 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.148  3.211  4.581  1.335  12.275  4.777 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.183  4.347  6.184  1.807  15.521  5.500 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.268  8.949  12.639  3.771  28.627  7.369 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.296  11.276  15.890  4.783  35.246  7.998 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.339  15.921  22.368  6.868  48.497  8.962 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.385  22.948  32.139  10.072  68.545  9.997 × 10^{5}
30.0 TeV 3.000 × 10^{7} 3.438  34.650  48.397  15.634 102.119  1.119 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.477  46.415  64.706  21.343 135.941  1.203 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.571  93.601 130.001  45.304 272.478  1.407 × 10^{6}
100. TeV 1.000 × 10^{8} 3.603 117.262 162.686  57.726 341.277  1.472 × 10^{6}