Muons in europium (Eu)

Z  A [g/mol] ρ [g/cm^{3}] I [eV]  a  k = m_{s}  x_{0}  x_{1}  \overline{C}  δ_{0}
63 (Eu) 151.964(1)  5.244  580.0 0.24448 2.6245 0.1888 3.4633 6.2276  0.14
T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 4.322  4.322  1.326 × 10^{0}
14.0 MeV 5.616 × 10^{1} 3.427  3.427  2.375 × 10^{0}
20.0 MeV 6.802 × 10^{1} 2.716  2.716  4.363 × 10^{0}
30.0 MeV 8.509 × 10^{1} 2.136  2.136  8.568 × 10^{0}
40.0 MeV 1.003 × 10^{2} 1.840  1.840  1.364 × 10^{1}
80.0 MeV 1.527 × 10^{2} 1.404  1.404  3.928 × 10^{1}
100. MeV 1.764 × 10^{2} 1.328  1.328  5.396 × 10^{1}
140. MeV 2.218 × 10^{2} 1.255  1.256  8.508 × 10^{1}
200. MeV 2.868 × 10^{2} 1.222  1.222  1.337 × 10^{2}
237. MeV 3.260 × 10^{2} 1.219  0.000  1.219 Minimum ionization
300. MeV 3.917 × 10^{2} 1.224  0.000  0.000  1.225  2.156 × 10^{2}
400. MeV 4.945 × 10^{2} 1.245  0.000  0.000  1.245  2.966 × 10^{2}
800. MeV 8.995 × 10^{2} 1.332  0.001  0.000  1.333  6.066 × 10^{2}
1.00 GeV 1.101 × 10^{3} 1.367  0.001  0.000  1.368  7.546 × 10^{2}
1.40 GeV 1.502 × 10^{3} 1.422  0.002  0.000  0.001  1.425  1.041 × 10^{3}
2.00 GeV 2.103 × 10^{3} 1.481  0.003  0.001  0.001  1.487  1.453 × 10^{3}
3.00 GeV 3.104 × 10^{3} 1.549  0.006  0.003  0.001  1.560  2.108 × 10^{3}
4.00 GeV 4.104 × 10^{3} 1.596  0.008  0.006  0.002  1.612  2.738 × 10^{3}
8.00 GeV 8.105 × 10^{3} 1.702  0.021  0.019  0.003  1.746  5.113 × 10^{3}
10.0 GeV 1.011 × 10^{4} 1.734  0.027  0.027  0.004  1.793  6.243 × 10^{3}
14.0 GeV 1.411 × 10^{4} 1.780  0.042  0.044  0.005  1.872  8.424 × 10^{3}
20.0 GeV 2.011 × 10^{4} 1.825  0.065  0.073  0.007  1.971  1.155 × 10^{4}
30.0 GeV 3.011 × 10^{4} 1.873  0.107  0.127  0.011  2.119  1.643 × 10^{4}
40.0 GeV 4.011 × 10^{4} 1.905  0.151  0.187  0.015  2.258  2.100 × 10^{4}
80.0 GeV 8.011 × 10^{4} 1.975  0.341  0.450  0.029  2.795  3.689 × 10^{4}
100. GeV 1.001 × 10^{5} 1.996  0.441  0.591  0.035  3.065  4.372 × 10^{4}
140. GeV 1.401 × 10^{5} 2.026  0.648  0.883  0.049  3.607  5.575 × 10^{4}
175. GeV 1.752 × 10^{5} 2.046  0.835  1.150  0.061  4.093 Muon critical energy
200. GeV 2.001 × 10^{5} 2.057  0.971  1.344  0.070  4.444  7.071 × 10^{4}
300. GeV 3.001 × 10^{5} 2.092  1.522  2.115  0.105  5.836  9.030 × 10^{4}
400. GeV 4.001 × 10^{5} 2.116  2.092  2.914  0.140  7.264  1.056 × 10^{5}
800. GeV 8.001 × 10^{5} 2.176  4.444  6.189  0.283  13.094  1.461 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.195  5.652  7.865  0.356  16.069  1.599 × 10^{5}
1.40 TeV 1.400 × 10^{6} 2.224  8.073  11.206  0.504  22.009  1.811 × 10^{5}
2.00 TeV 2.000 × 10^{6} 2.256  11.775  16.304  0.730  31.066  2.039 × 10^{5}
3.00 TeV 3.000 × 10^{6} 2.292  17.954  24.776  1.115  46.139  2.301 × 10^{5}
4.00 TeV 4.000 × 10^{6} 2.318  24.215  33.337  1.507  61.379  2.489 × 10^{5}
8.00 TeV 8.000 × 10^{6} 2.383  49.450  67.749  3.130 122.713  2.941 × 10^{5}
10.0 TeV 1.000 × 10^{7} 2.404  62.164  85.045  3.963 153.577  3.086 × 10^{5}
14.0 TeV 1.400 × 10^{7} 2.436  87.524 119.558  5.673 215.192  3.305 × 10^{5}
20.0 TeV 2.000 × 10^{7} 2.471 125.782 171.546  8.292 308.092  3.537 × 10^{5}
30.0 TeV 3.000 × 10^{7} 2.511 189.472 258.043  12.816 462.844  3.800 × 10^{5}
40.0 TeV 4.000 × 10^{7} 2.540 253.386 344.741  17.446 618.115  3.986 × 10^{5}
80.0 TeV 8.000 × 10^{7} 2.612 509.409 691.770  36.772 1240.563  4.434 × 10^{5}
100. TeV 1.000 × 10^{8} 2.635 637.630 865.440  46.750 1552.457  4.578 × 10^{5}