Muons in ethylene (C_{2}H_{4})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.57034 & 1.175 × 10^{−3} & 50.7 & 0.10636 & 3.5387 & 1.5528 & 3.9327 & 9.4380 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.598  8.598  6.406 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.695  6.695  1.173 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.219  5.220  2.200 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.042  4.042  4.408 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.447  3.447  7.105 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.581  2.581  2.095 × 10^{1}
100. MeV 1.764 × 10^{2} 2.425  2.425  2.896 × 10^{1}
140. MeV 2.218 × 10^{2} 2.271  2.272  4.608 × 10^{1}
200. MeV 2.868 × 10^{2} 2.192  2.192  7.307 × 10^{1}
266. MeV 3.567 × 10^{2} 2.174  0.000  2.175 Minimum ionization
300. MeV 3.917 × 10^{2} 2.177  0.000  2.177  1.190 × 10^{2}
400. MeV 4.945 × 10^{2} 2.203  0.000  2.203  1.647 × 10^{2}
800. MeV 8.995 × 10^{2} 2.341  0.000  0.000  2.342  3.407 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.401  0.000  0.000  2.401  4.250 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.498  0.000  0.001  2.499  5.881 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.607  0.000  0.000  0.001  2.609  8.228 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.736  0.001  0.000  0.001  2.739  1.196 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.825  0.001  0.001  0.002  2.829  1.555 × 10^{3}
8.00 GeV 8.105 × 10^{3} 3.003  0.003  0.003  0.004  3.012  2.919 × 10^{3}
10.0 GeV 1.011 × 10^{4} 3.054  0.004  0.004  0.005  3.066  3.577 × 10^{3}
14.0 GeV 1.411 × 10^{4} 3.127  0.006  0.006  0.007  3.145  4.864 × 10^{3}
20.0 GeV 2.011 × 10^{4} 3.197  0.009  0.010  0.009  3.225  6.746 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.270  0.015  0.018  0.014  3.316  9.801 × 10^{3}
40.0 GeV 4.011 × 10^{4} 3.317  0.021  0.026  0.018  3.382  1.279 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.419  0.047  0.063  0.035  3.564  2.429 × 10^{4}
100. GeV 1.001 × 10^{5} 3.449  0.061  0.084  0.043  3.637  2.984 × 10^{4}
140. GeV 1.401 × 10^{5} 3.492  0.091  0.126  0.060  3.769  4.064 × 10^{4}
200. GeV 2.001 × 10^{5} 3.537  0.137  0.193  0.085  3.951  5.618 × 10^{4}
300. GeV 3.001 × 10^{5} 3.585  0.216  0.307  0.127  4.236  8.061 × 10^{4}
400. GeV 4.001 × 10^{5} 3.619  0.299  0.427  0.170  4.515  1.035 × 10^{5}
800. GeV 8.001 × 10^{5} 3.701  0.644  0.925  0.343  5.613  1.828 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.728  0.822  1.183  0.430  6.164  2.168 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.768  1.182  1.697  0.611  7.258  2.765 × 10^{5}
1.51 TeV 1.508 × 10^{6} 3.777  1.281  1.837  0.659  7.554 Muon critical energy
2.00 TeV 2.000 × 10^{6} 3.811  1.736  2.485  0.884  8.917  3.510 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.861  2.665  3.799  1.355  11.681  4.487 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.897  3.612  5.132  1.834  14.476  5.254 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.986  7.450  10.502  3.831  25.770  7.298 × 10^{5}
10.0 TeV 1.000 × 10^{7} 4.015  9.393  13.208  4.860  31.477  7.999 × 10^{5}
14.0 TeV 1.400 × 10^{7} 4.059  13.272  18.599  6.982  42.912  9.083 × 10^{5}
20.0 TeV 2.000 × 10^{7} 4.107  19.144  26.732  10.243  60.227  1.026 × 10^{6}
30.0 TeV 3.000 × 10^{7} 4.163  28.924  40.262  15.907  89.256  1.161 × 10^{6}
40.0 TeV 4.000 × 10^{7} 4.202  38.762  53.838  21.722 118.524  1.258 × 10^{6}
80.0 TeV 8.000 × 10^{7} 4.301  78.203 108.188  46.153 236.845  1.493 × 10^{6}
100. TeV 1.000 × 10^{8} 4.333  97.977 135.397  58.825 296.533  1.568 × 10^{6}