Muons in ethyl cellulose ([C_{12}H_{22}O5)_{n}]

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.54405 & 1.130 & 69.3 & 0.11077 & 3.4098 & 0.1683 & 2.6527 & 3.2415 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 7.886  7.886  7.003 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.149  6.149  1.281 × 10^{0}
20.0 MeV 6.802 × 10^{1} 4.801  4.801  2.398 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.723  3.723  4.796 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.178  3.178  7.723 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.385  2.385  2.272 × 10^{1}
100. MeV 1.764 × 10^{2} 2.235  2.235  3.140 × 10^{1}
140. MeV 2.218 × 10^{2} 2.080  2.080  5.005 × 10^{1}
200. MeV 2.868 × 10^{2} 1.990  1.990  7.965 × 10^{1}
300. MeV 3.917 × 10^{2} 1.955  0.000  1.955  1.305 × 10^{2}
318. MeV 4.105 × 10^{2} 1.954  0.000  1.955 Minimum ionization
400. MeV 4.945 × 10^{2} 1.960  0.000  1.961  1.816 × 10^{2}
800. MeV 8.995 × 10^{2} 2.032  0.000  0.000  2.033  3.821 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.065  0.000  0.000  2.066  4.796 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.120  0.000  0.001  2.121  6.706 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.179  0.001  0.000  0.001  2.181  9.494 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.247  0.001  0.001  0.001  2.250  1.400 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.294  0.001  0.001  0.002  2.299  1.840 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.403  0.003  0.003  0.004  2.413  3.533 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.436  0.004  0.004  0.005  2.449  4.355 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.484  0.006  0.007  0.007  2.504  5.970 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.532  0.010  0.011  0.009  2.563  8.337 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.584  0.016  0.020  0.014  2.634  1.218 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.620  0.023  0.029  0.018  2.690  1.594 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.702  0.053  0.071  0.034  2.861  3.033 × 10^{4}
100. GeV 1.001 × 10^{5} 2.728  0.069  0.094  0.043  2.933  3.723 × 10^{4}
140. GeV 1.401 × 10^{5} 2.766  0.101  0.141  0.059  3.068  5.056 × 10^{4}
200. GeV 2.001 × 10^{5} 2.806  0.153  0.216  0.084  3.259  6.953 × 10^{4}
300. GeV 3.001 × 10^{5} 2.851  0.241  0.344  0.126  3.562  9.887 × 10^{4}
400. GeV 4.001 × 10^{5} 2.883  0.333  0.477  0.168  3.861  1.258 × 10^{5}
800. GeV 8.001 × 10^{5} 2.961  0.717  1.031  0.339  5.048  2.161 × 10^{5}
1.00 TeV 1.000 × 10^{6} 2.986  0.915  1.318  0.426  5.645  2.536 × 10^{5}
1.12 TeV 1.119 × 10^{6} 2.999  1.033  1.487  0.479  5.998 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.025  1.314  1.889  0.604  6.832  3.179 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.066  1.928  2.764  0.875  8.634  3.959 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.114  2.957  4.221  1.341  11.634  4.953 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.148  4.005  5.700  1.815  14.668  5.717 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.232  8.249  11.655  3.789  26.926  7.700 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.260  10.396  14.654  4.806  33.117  8.369 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.302  14.681  20.631  6.903  45.517  9.395 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.348  21.165  29.646  10.124  64.283  1.050 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.401  31.962  44.645  15.717  95.725  1.177 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.439  42.818  59.694  21.458 127.409  1.267 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.533  86.347 119.940  45.559 255.379  1.484 × 10^{6}
100. TeV 1.000 × 10^{8} 3.564 108.169 150.100  58.056 319.888  1.554 × 10^{6}