Muons in ethanol (C_{2}H_{5}OH)

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.56437 & 0.789 & 62.9 & 0.09878 & 3.4834 & 0.2218 & 2.7052 & 3.3699 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 8.282  8.282  6.662 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 6.455  6.455  1.219 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.037  5.037  2.283 × 10^{0}
30.0 MeV 8.509 × 10^{1} 3.905  3.905  4.570 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.332  3.332  7.360 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.499  2.499  2.167 × 10^{1}
100. MeV 1.764 × 10^{2} 2.349  2.349  2.994 × 10^{1}
140. MeV 2.218 × 10^{2} 2.186  2.186  4.768 × 10^{1}
200. MeV 2.868 × 10^{2} 2.092  2.092  7.584 × 10^{1}
300. MeV 3.917 × 10^{2} 2.055  0.000  2.055  1.242 × 10^{2}
325. MeV 4.171 × 10^{2} 2.054  0.000  2.054 Minimum ionization
400. MeV 4.945 × 10^{2} 2.060  0.000  2.060  1.729 × 10^{2}
800. MeV 8.995 × 10^{2} 2.135  0.000  0.000  2.135  3.637 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.169  0.000  0.000  2.170  4.566 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.225  0.000  0.001  2.226  6.384 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.287  0.001  0.000  0.001  2.289  9.040 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.358  0.001  0.001  0.001  2.361  1.334 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.407  0.001  0.001  0.002  2.412  1.752 × 10^{3}
8.00 GeV 8.105 × 10^{3} 2.520  0.003  0.003  0.004  2.530  3.367 × 10^{3}
10.0 GeV 1.011 × 10^{4} 2.554  0.004  0.004  0.005  2.568  4.151 × 10^{3}
14.0 GeV 1.411 × 10^{4} 2.604  0.006  0.007  0.007  2.624  5.691 × 10^{3}
20.0 GeV 2.011 × 10^{4} 2.654  0.010  0.011  0.009  2.685  7.950 × 10^{3}
30.0 GeV 3.011 × 10^{4} 2.709  0.016  0.020  0.014  2.758  1.162 × 10^{4}
40.0 GeV 4.011 × 10^{4} 2.746  0.023  0.029  0.018  2.816  1.521 × 10^{4}
80.0 GeV 8.011 × 10^{4} 2.831  0.052  0.070  0.035  2.988  2.897 × 10^{4}
100. GeV 1.001 × 10^{5} 2.857  0.068  0.093  0.043  3.061  3.559 × 10^{4}
140. GeV 1.401 × 10^{5} 2.897  0.100  0.140  0.060  3.197  4.837 × 10^{4}
200. GeV 2.001 × 10^{5} 2.938  0.151  0.214  0.084  3.388  6.659 × 10^{4}
300. GeV 3.001 × 10^{5} 2.985  0.239  0.340  0.126  3.691  9.486 × 10^{4}
400. GeV 4.001 × 10^{5} 3.018  0.330  0.472  0.168  3.989  1.209 × 10^{5}
800. GeV 8.001 × 10^{5} 3.099  0.710  1.021  0.340  5.171  2.087 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.126  0.907  1.305  0.428  5.766  2.453 × 10^{5}
1.18 TeV 1.178 × 10^{6} 3.145  1.082  1.556  0.507  6.290 Muon critical energy
1.40 TeV 1.400 × 10^{6} 3.165  1.303  1.871  0.607  6.946  3.085 × 10^{5}
2.00 TeV 2.000 × 10^{6} 3.208  1.912  2.738  0.878  8.737  3.853 × 10^{5}
3.00 TeV 3.000 × 10^{6} 3.258  2.934  4.183  1.346  11.721  4.838 × 10^{5}
4.00 TeV 4.000 × 10^{6} 3.293  3.974  5.648  1.822  14.738  5.597 × 10^{5}
8.00 TeV 8.000 × 10^{6} 3.381  8.188  11.551  3.805  26.926  7.576 × 10^{5}
10.0 TeV 1.000 × 10^{7} 3.410  10.321  14.525  4.826  33.083  8.245 × 10^{5}
14.0 TeV 1.400 × 10^{7} 3.454  14.578  20.449  6.932  45.414  9.273 × 10^{5}
20.0 TeV 2.000 × 10^{7} 3.501  21.021  29.387  10.168  64.077  1.038 × 10^{6}
30.0 TeV 3.000 × 10^{7} 3.556  31.750  44.256  15.787  95.349  1.165 × 10^{6}
40.0 TeV 4.000 × 10^{7} 3.595  42.540  59.174  21.556 126.865  1.256 × 10^{6}
80.0 TeV 8.000 × 10^{7} 3.693  85.811 118.898  45.780 254.182  1.474 × 10^{6}
100. TeV 1.000 × 10^{8} 3.725 107.507 148.796  58.342 318.370  1.544 × 10^{6}