Muons in ethane (C_{2}H_{6})

\begin{matrix}⟨Z/A⟩ & ρ [g/cm^{3}] & I [eV] & a & k = m_{s} & x_{0} & x_{1} & \overline{C} & δ_{0} \\ 0.59861 & 1.263 × 10^{−3} & 45.4 & 0.09627 & 3.6095 & 1.5090 & 3.8726 & 9.0965 & 0.00 \end{matrix}

T  p  Ionization Brems Pair prod Photonucl Total  CSDA range
[MeV/c]  [MeV cm^{2}/g]  [g/cm^{2}]
10.0 MeV 4.704 × 10^{1} 9.147  9.147  6.016 × 10^{−1}
14.0 MeV 5.616 × 10^{1} 7.119  7.119  1.103 × 10^{0}
20.0 MeV 6.802 × 10^{1} 5.547  5.548  2.068 × 10^{0}
30.0 MeV 8.509 × 10^{1} 4.294  4.294  4.146 × 10^{0}
40.0 MeV 1.003 × 10^{2} 3.661  3.661  6.685 × 10^{0}
80.0 MeV 1.527 × 10^{2} 2.739  2.739  1.972 × 10^{1}
100. MeV 1.764 × 10^{2} 2.573  2.573  2.728 × 10^{1}
140. MeV 2.218 × 10^{2} 2.409  2.409  4.342 × 10^{1}
200. MeV 2.868 × 10^{2} 2.323  2.323  6.888 × 10^{1}
267. MeV 3.577 × 10^{2} 2.304  0.000  2.304 Minimum ionization
300. MeV 3.917 × 10^{2} 2.307  0.000  2.307  1.122 × 10^{2}
400. MeV 4.945 × 10^{2} 2.333  0.000  2.333  1.553 × 10^{2}
800. MeV 8.995 × 10^{2} 2.478  0.000  0.000  2.479  3.216 × 10^{2}
1.00 GeV 1.101 × 10^{3} 2.540  0.000  0.000  2.541  4.012 × 10^{2}
1.40 GeV 1.502 × 10^{3} 2.642  0.000  0.001  2.643  5.555 × 10^{2}
2.00 GeV 2.103 × 10^{3} 2.757  0.000  0.000  0.001  2.759  7.774 × 10^{2}
3.00 GeV 3.104 × 10^{3} 2.892  0.001  0.000  0.001  2.895  1.131 × 10^{3}
4.00 GeV 4.104 × 10^{3} 2.979  0.001  0.001  0.002  2.983  1.471 × 10^{3}
8.00 GeV 8.105 × 10^{3} 3.158  0.003  0.003  0.004  3.168  2.766 × 10^{3}
10.0 GeV 1.011 × 10^{4} 3.210  0.004  0.004  0.005  3.222  3.392 × 10^{3}
14.0 GeV 1.411 × 10^{4} 3.283  0.005  0.006  0.007  3.302  4.617 × 10^{3}
20.0 GeV 2.011 × 10^{4} 3.355  0.009  0.010  0.009  3.383  6.411 × 10^{3}
30.0 GeV 3.011 × 10^{4} 3.428  0.014  0.017  0.014  3.474  9.326 × 10^{3}
40.0 GeV 4.011 × 10^{4} 3.476  0.020  0.025  0.018  3.540  1.218 × 10^{4}
80.0 GeV 8.011 × 10^{4} 3.580  0.046  0.062  0.035  3.723  2.317 × 10^{4}
100. GeV 1.001 × 10^{5} 3.611  0.060  0.081  0.043  3.796  2.849 × 10^{4}
140. GeV 1.401 × 10^{5} 3.656  0.088  0.123  0.060  3.927  3.885 × 10^{4}
200. GeV 2.001 × 10^{5} 3.702  0.133  0.188  0.085  4.108  5.378 × 10^{4}
300. GeV 3.001 × 10^{5} 3.752  0.211  0.300  0.128  4.391  7.732 × 10^{4}
400. GeV 4.001 × 10^{5} 3.788  0.292  0.416  0.171  4.666  9.940 × 10^{4}
800. GeV 8.001 × 10^{5} 3.874  0.629  0.903  0.345  5.750  1.765 × 10^{5}
1.00 TeV 1.000 × 10^{6} 3.901  0.804  1.155  0.433  6.293  2.097 × 10^{5}
1.40 TeV 1.400 × 10^{6} 3.944  1.156  1.657  0.614  7.371  2.684 × 10^{5}
1.60 TeV 1.603 × 10^{6} 3.961  1.338  1.916  0.707  7.922 Muon critical energy
2.00 TeV 2.000 × 10^{6} 3.989  1.698  2.428  0.889  9.005  3.419 × 10^{5}
3.00 TeV 3.000 × 10^{6} 4.042  2.609  3.712  1.363  11.726  4.390 × 10^{5}
4.00 TeV 4.000 × 10^{6} 4.080  3.537  5.015  1.845  14.477  5.156 × 10^{5}
8.00 TeV 8.000 × 10^{6} 4.172  7.302  10.268  3.855  25.597  7.207 × 10^{5}
10.0 TeV 1.000 × 10^{7} 4.203  9.209  12.915  4.890  31.218  7.913 × 10^{5}
14.0 TeV 1.400 × 10^{7} 4.250  13.016  18.188  7.026  42.480  9.008 × 10^{5}
20.0 TeV 2.000 × 10^{7} 4.300  18.781  26.144  10.309  59.534  1.020 × 10^{6}
30.0 TeV 3.000 × 10^{7} 4.358  28.385  39.377  16.013  88.134  1.157 × 10^{6}
40.0 TeV 4.000 × 10^{7} 4.400  38.048  52.656  21.871 116.975  1.255 × 10^{6}
80.0 TeV 8.000 × 10^{7} 4.503  76.798 105.818  46.487 233.606  1.492 × 10^{6}
100. TeV 1.000 × 10^{8} 4.537  96.230 132.432  59.258 292.458  1.569 × 10^{6}